Summary Page Created:Sat September 16, 2006 14:12 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700517

Instrument: ACIS Obs ID: 3078 Source: HS 1824+6507 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03078N002 full img2.fits acisf03078N002 cntr img2.fits

Summary Page Created:Sat September 16, 2006 14:12 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700517

Instrument: ACIS Obs ID: 3078 Source: HS 1824+6507 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-16T17:42:18 Date and time of file creation DATE-OBS 2002-05-20T17:30:24 Observation start date DATE-END 2002-05-20T19:58:10 Observation end date RA PNT 276.17848575851 Pointing RA DEC PNT 65.164010184576 Pointing Dec ROLL PNT 144.00747534298 Pointing Roll RA TARG 276.194583 Observer’s specified target RA DEC TARG 65.157 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-16T18:11:08 Date and time of file creation DATE-OBS 2002-05-20T17:30:24 Observation start date DATE-END 2002-05-20T19:58:10 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1824+6507 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3078 Observation id SEQ NUM 700517 Sequence number RA NOM 276.17848575851 Nominal RA DEC NOM 65.164010184576 Nominal Dec ROLL NOM 144.00747534298 Nominal Roll

Summary Page Created:Sat September 16, 2006 14:12 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700517

Instrument: ACIS Obs ID: 3078 Source: HS 1824+6507 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 276.193283 65.156872 1039.285767 34.395580 30.215677 275.673248 65.391041 158.043182 27.626568 5.720696 276.153162 65.214465 48.159092 8.484392 5.676198 276.004841 65.193322 39.857143 8.774302 4.542486 276.160630 65.322957 40.872501 9.656277 4.232739 275.803827 65.356163 82.708336 20.257292 4.082892 275.516984 65.288627 104.026787 27.113577 3.836704 275.762833 65.365369 85.704544 22.764069 3.764904 276.166161 65.148247 23.714285 6.768929 3.503403 275.496840 65.292611 77.697678 22.417128 3.465996