Summary Page Created:Sat September 16, 2006 13:16 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700518

Instrument: ACIS Obs ID: 3079 Source: HS 1939+7000 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03079N002 full img2.fits acisf03079N002 cntr img2.fits

Summary Page Created:Sat September 16, 2006 13:16 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700518

Instrument: ACIS Obs ID: 3079 Source: HS 1939+7000 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-16T17:00:04 Date and time of file creation DATE-OBS 2002-05-19T15:09:39 Observation start date DATE-END 2002-05-19T16:57:46 Observation end date RA PNT 294.860432456 Pointing RA DEC PNT 70.139114328335 Pointing Dec ROLL PNT 125.78467388847 Pointing Roll RA TARG 294.872917 Observer’s specified target RA DEC TARG 70.130278 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-16T17:15:21 Date and time of file creation DATE-OBS 2002-05-19T15:09:39 Observation start date DATE-END 2002-05-19T16:57:46 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 1939+7000 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3079 Observation id SEQ NUM 700518 Sequence number RA NOM 294.860432456 Nominal RA DEC NOM 70.139114328335 Nominal Dec ROLL NOM 125.78467388847 Nominal Roll

Summary Page Created:Sat September 16, 2006 13:16 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700518

Instrument: ACIS Obs ID: 3079 Source: HS 1939+7000 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 294.872611 70.130300 874.285706 33.230804 26.309498 295.328304 70.310962 281.313721 21.140244 13.307023 295.290641 70.005622 56.802677 12.027251 4.722831 294.870542 70.096549 40.142857 8.566412 4.686076 294.431423 70.412335 132.298996 29.186201 4.532930 294.469176 70.423515 95.079735 22.561531 4.214241 294.277600 70.373249 131.485046 31.607357 4.159951 294.182737 70.347861 115.209305 27.838026 4.138558 294.263099 70.306842 86.113640 21.930977 3.926575 294.376399 70.396946 109.608032 27.990074 3.915961