Summary Page Created:Wed September 20, 2006 23:48 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700519

Instrument: ACIS Obs ID: 3080 Source: HS 2135+1326 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03080N002 full img2.fits acisf03080N002 cntr img2.fits

Summary Page Created:Wed September 20, 2006 23:48 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700519

Instrument: ACIS Obs ID: 3080 Source: HS 2135+1326 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T03:31:03 Date and time of file creation DATE-OBS 2002-06-26T13:42:12 Observation start date DATE-END 2002-06-26T15:51:10 Observation end date RA PNT 324.51752536905 Pointing RA DEC PNT 13.673442649424 Pointing Dec ROLL PNT 127.19210029175 Pointing Roll RA TARG 324.522083 Observer’s specified target RA DEC TARG 13.664861 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T03:47:46 Date and time of file creation DATE-OBS 2002-06-26T13:42:12 Observation start date DATE-END 2002-06-26T15:51:10 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 2135+1326 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3080 Observation id SEQ NUM 700519 Sequence number RA NOM 324.51752536905 Nominal RA DEC NOM 13.673442649424 Nominal Dec ROLL NOM 127.19210029175 Nominal Roll

Summary Page Created:Wed September 20, 2006 23:48 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700519

Instrument: ACIS Obs ID: 3080 Source: HS 2135+1326 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 324.521972 13.664963 51.714287 8.850558 5.843053 324.276410 13.881724 125.315613 23.768759 5.272283 324.375472 13.953319 137.189362 26.567469 5.163810 324.392181 13.937305 105.417854 26.307278 4.007175 324.624369 13.640780 34.180000 8.776159 3.894642 324.328158 13.805875 63.129654 16.283064 3.877013 324.302287 13.900835 96.036545 25.830862 3.717900 324.316053 13.908183 102.521591 27.979883 3.664118 324.432655 13.885876 65.835770 18.051325 3.647143 324.607112 13.560047 27.477272 7.572146 3.628730