Summary Page Created:Mon October 2, 2006 19:27 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700520

Instrument: ACIS Obs ID: 3081 Source: HS 2146+0428 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03081N002 full img2.fits acisf03081N002 cntr img2.fits

Summary Page Created:Mon October 2, 2006 19:27 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700520

Instrument: ACIS Obs ID: 3081 Source: HS 2146+0428 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-02T23:08:01 Date and time of file creation DATE-OBS 2002-09-08T20:53:43 Observation start date DATE-END 2002-09-08T23:44:46 Observation end date RA PNT 327.12834898068 Pointing RA DEC PNT 4.696553166746 Pointing Dec ROLL PNT 243.24574925764 Pointing Roll RA TARG 327.134167 Observer’s specified target RA DEC TARG 4.704389 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-02T23:25:19 Date and time of file creation DATE-OBS 2002-09-08T20:53:43 Observation start date DATE-END 2002-09-08T23:44:46 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 2146+0428 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3081 Observation id SEQ NUM 700520 Sequence number RA NOM 327.12834898068 Nominal RA DEC NOM 4.696553166746 Nominal Dec ROLL NOM 243.24574925764 Nominal Roll

Summary Page Created:Mon October 2, 2006 19:27 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700520

Instrument: ACIS Obs ID: 3081 Source: HS 2146+0428 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 327.134199 4.704394 164.142853 14.490862 11.327335 327.048493 4.396596 162.342194 26.972712 6.018757 326.938562 4.448735 151.209305 28.508387 5.304029 327.274963 4.838288 80.605354 15.271032 5.278317 327.106879 4.768396 48.857143 9.341268 5.230247 327.062368 4.428483 153.416672 29.671551 5.170497 327.216266 4.868527 87.541664 17.720278 4.940197 327.049614 4.402821 143.078568 29.202827 4.899477 327.036546 4.586908 44.875000 9.396479 4.775725 327.004029 4.415716 140.305649 29.846560 4.700899