Summary Page Created:Thu September 14, 2006 14:33 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700521

Instrument: ACIS Obs ID: 3082 Source: HS 2251+2941 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

acisf03082N002 full img2.fits acisf03082N002 cntr img2.fits

Summary Page Created:Thu September 14, 2006 14:33 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700521

Instrument: ACIS Obs ID: 3082 Source: HS 2251+2941 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-14T17:57:50 Date and time of file creation DATE-OBS 2002-04-27T19:37:47 Observation start date DATE-END 2002-04-27T22:03:22 Observation end date RA PNT 343.41368358293 Pointing RA DEC PNT 29.962620409638 Pointing Dec ROLL PNT 83.243891148259 Pointing Roll RA TARG 343.410417 Observer’s specified target RA DEC TARG 29.953361 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-14T18:31:44 Date and time of file creation DATE-OBS 2002-04-27T19:37:47 Observation start date DATE-END 2002-04-27T22:03:22 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HS 2251+2941 Source name TITLE X-RAY WEAK BROAD- LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAK- NESS ?

Proposal title

OBSERVER Dr Guido Risaliti Principal investigator OBS ID 3082 Observation id SEQ NUM 700521 Sequence number RA NOM 343.41368358293 Nominal RA DEC NOM 29.962620409638 Nominal Dec ROLL NOM 83.243891148259 Nominal Roll

Summary Page Created:Thu September 14, 2006 14:33 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700521

Instrument: ACIS Obs ID: 3082 Source: HS 2251+2941 PI: Dr Guido Risaliti Title: X-RAY WEAK BROAD-LINE QUASARS: ABSORPTION OR INTRINSIC X RAY WEAKNESS ?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 343.519549 30.257579 201.707642 32.167973 6.270449 343.486277 30.104449 53.282501 9.791301 5.441821 343.490003 30.262877 163.382065 30.209339 5.408329 343.384556 30.271054 148.362122 28.372965 5.228996 343.420970 30.269716 150.215942 29.023020 5.175752 343.446781 29.911811 40.079544 7.761722 5.163744 343.519321 30.199037 105.993103 21.209318 4.997478 343.474415 30.263354 139.923584 30.036263 4.658489 343.410927 29.953499 35.714287 7.743237 4.612320 343.368299 30.186308 82.779259 18.843904 4.392893