Summary Page Created:Tue September 19, 2006 04:29 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700526

Instrument: ACIS Obs ID: 3087 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

acisf03087N002 full img2.fits acisf03087N002 cntr img2.fits

Summary Page Created:Tue September 19, 2006 04:29 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700526

Instrument: ACIS Obs ID: 3087 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T07:58:18 Date and time of file creation DATE-OBS 2002-06-08T19:58:05 Observation start date DATE-END 2002-06-08T21:47:18 Observation end date RA PNT 187.69681018172 Pointing RA DEC PNT 12.38149719204 Pointing Dec ROLL PNT 242.56515506462 Pointing Roll RA TARG 187.704167 Observer’s specified target RA DEC TARG 12.391667 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-19T08:29:00 Date and time of file creation DATE-OBS 2002-06-08T19:58:05 Observation start date DATE-END 2002-06-08T21:47:18 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT M87 Source name TITLE X-RAY VARIABILITY IN THE JET AND CORE OF M87

Proposal title

OBSERVER Dr. Daniel Harris Principal investigator OBS ID 3087 Observation id SEQ NUM 700526 Sequence number RA NOM 187.69681018172 Nominal RA DEC NOM 12.38149719204 Nominal Dec ROLL NOM 242.56515506462 Nominal Roll

Summary Page Created:Tue September 19, 2006 04:29 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700526

Instrument: ACIS Obs ID: 3087 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 187.705797 12.391223 4323.285645 76.077202 56.827614 187.702642 12.392359 1244.714233 43.938374 28.328638 187.705058 12.391482 326.571442 34.820805 9.378630 187.701038 12.393023 113.000000 19.486256 5.798959 187.704388 12.391754 139.142853 24.851627 5.598943 187.711958 12.390267 30.571428 8.374018 3.650748 187.711662 12.417246 30.285715 8.579084 3.530180 187.697072 12.381718 27.285715 8.373115 3.258729