Summary Page Created:Fri August 25, 2006 21:06 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700542

Instrument: ACIS Obs ID: 3103 Source: Q1328+254 PI: Dr Aneta Siemiginowska Title: X-RAY IMAGING OF GPS AND CSS QUASARS

acisf03103N003 full img2.fits acisf03103N003 cntr img2.fits

Summary Page Created:Fri August 25, 2006 21:06 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700542

Instrument: ACIS Obs ID: 3103 Source: Q1328+254 PI: Dr Aneta Siemiginowska Title: X-RAY IMAGING OF GPS AND CSS QUASARS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-25T23:43:22 Date and time of file creation DATE-OBS 2002-01-06T11:51:47 Observation start date DATE-END 2002-01-06T23:22:05 Observation end date RA PNT 202.66330542492 Pointing RA DEC PNT 25.161181402196 Pointing Dec ROLL PNT 67.526761916568 Pointing Roll RA TARG 202.6575 Observer’s specified target RA DEC TARG 25.153 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-26T01:05:37 Date and time of file creation DATE-OBS 2002-01-06T11:51:47 Observation start date DATE-END 2002-01-06T23:22:05 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT Q1328+254 Source name TITLE X-RAY IMAGING OF GPS AND CSS QUASARS

Proposal title

OBSERVER Dr Aneta Siemiginowska Principal investigator OBS ID 3103 Observation id SEQ NUM 700542 Sequence number RA NOM 202.66330542492 Nominal RA DEC NOM 25.161181402196 Nominal Dec ROLL NOM 67.526761916568 Nominal Roll

Summary Page Created:Fri August 25, 2006 21:06 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700542

Instrument: ACIS Obs ID: 3103 Source: Q1328+254 PI: Dr Aneta Siemiginowska Title: X-RAY IMAGING OF GPS AND CSS QUASARS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 202.657047 25.153054 4033.571533 66.452530 60.698536 202.658901 25.160678 56.142857 9.570412 5.866295 202.647437 25.146945 52.142857 9.331176 5.588027 202.639824 25.086858 27.583334 8.489096 3.249266