Summary Page Created:Thu October 5, 2006 18:20 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700545

Instrument: ACIS Obs ID: 3106 Source: Q1829+290 PI: Dr Aneta Siemiginowska Title: X-RAY IMAGING OF GPS AND CSS QUASARS

acisf03106N002 full img2.fits acisf03106N002 cntr img2.fits

Summary Page Created:Thu October 5, 2006 18:20 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700545

Instrument: ACIS Obs ID: 3106 Source: Q1829+290 PI: Dr Aneta Siemiginowska Title: X-RAY IMAGING OF GPS AND CSS QUASARS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-05T21:58:40 Date and time of file creation DATE-OBS 2002-10-08T20:04:40 Observation start date DATE-END 2002-10-08T21:58:36 Observation end date RA PNT 277.81184535007 Pointing RA DEC PNT 29.109760619584 Pointing Dec ROLL PNT 278.52392077117 Pointing Roll RA TARG 277.812083 Observer’s specified target RA DEC TARG 29.119472 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-05T22:18:41 Date and time of file creation DATE-OBS 2002-10-08T20:04:40 Observation start date DATE-END 2002-10-08T21:58:36 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT Q1829+290 Source name TITLE X-RAY IMAGING OF GPS AND CSS QUASARS

Proposal title

OBSERVER Dr Aneta Siemiginowska Principal investigator OBS ID 3106 Observation id SEQ NUM 700545 Sequence number RA NOM 277.81184535007 Nominal RA DEC NOM 29.109760619584 Nominal Dec ROLL NOM 278.52392077117 Nominal Roll

Summary Page Created:Thu October 5, 2006 18:20 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700545

Instrument: ACIS Obs ID: 3106 Source: Q1829+290 PI: Dr Aneta Siemiginowska Title: X-RAY IMAGING OF GPS AND CSS QUASARS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 277.856324 28.804273 143.003326 23.709965 6.031359 277.870495 28.808623 130.259140 25.794298 5.049920 277.845895 28.844622 110.272728 22.591007 4.881267 277.853872 28.809060 120.559822 25.399433 4.746556 277.850104 28.826113 110.500000 24.800037 4.455638 277.849484 28.836732 109.708336 26.667824 4.113884 277.648975 29.147390 29.397728 7.571121 3.882876 277.828435 29.015670 24.159090 6.639366 3.638765 277.832849 28.905485 50.549999 14.005654 3.609257 277.811908 29.119505 20.000000 6.051155 3.305154