Summary Page Created:Sat October 7, 2006 02:07 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700546

Instrument: ACIS Obs ID: 3107 Source: Q2127+040 PI: Dr Aneta Siemiginowska Title: X-RAY IMAGING OF GPS AND CSS QUASARS

acisf03107N002 full img2.fits acisf03107N002 cntr img2.fits

Summary Page Created:Sat October 7, 2006 02:07 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700546

Instrument: ACIS Obs ID: 3107 Source: Q2127+040 PI: Dr Aneta Siemiginowska Title: X-RAY IMAGING OF GPS AND CSS QUASARS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-07T05:38:08 Date and time of file creation DATE-OBS 2002-10-11T23:54:46 Observation start date DATE-END 2002-10-12T01:52:29 Observation end date RA PNT 322.63631533302 Pointing RA DEC PNT 5.0283992288205 Pointing Dec ROLL PNT 275.41655215901 Pointing Roll RA TARG 322.637083 Observer’s specified target RA DEC TARG 5.038056 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-07T06:06:17 Date and time of file creation DATE-OBS 2002-10-11T23:54:46 Observation start date DATE-END 2002-10-12T01:52:29 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT Q2127+040 Source name TITLE X-RAY IMAGING OF GPS AND CSS QUASARS

Proposal title

OBSERVER Dr Aneta Siemiginowska Principal investigator OBS ID 3107 Observation id SEQ NUM 700546 Sequence number RA NOM 322.63631533302 Nominal RA DEC NOM 5.0283992288205 Nominal Dec ROLL NOM 275.41655215901 Nominal Roll

Summary Page Created:Sat October 7, 2006 02:07 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700546

Instrument: ACIS Obs ID: 3107 Source: Q2127+040 PI: Dr Aneta Siemiginowska Title: X-RAY IMAGING OF GPS AND CSS QUASARS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 322.636956 5.038171 96.000000 11.098575 8.649759 322.656961 4.722730 197.495010 27.562193 7.165432 322.655329 4.734813 182.545532 31.632462 5.770829 322.673573 4.749730 165.833328 29.512939 5.619004 322.653671 4.743824 167.166672 30.136320 5.547017 322.676482 4.727778 145.054459 27.932552 5.193026 322.674868 4.723053 139.119598 27.221226 5.110703 322.651834 4.763213 123.477272 25.893661 4.768630 322.649141 4.777850 94.750000 21.812555 4.343829 322.644583 4.804926 76.824471 18.435726 4.167152