Summary Page Created:Wed September 20, 2006 22:17 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800183

Instrument: ACIS Obs ID: 3183 Source: A133 OFFSET PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF A133

acisf03183N003 full img2.fits acisf03183N003 cntr img2.fits

Summary Page Created:Wed September 20, 2006 22:17 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800183

Instrument: ACIS Obs ID: 3183 Source: A133 OFFSET PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF A133

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T01:46:42 Date and time of file creation DATE-OBS 2002-06-24T06:34:59 Observation start date DATE-END 2002-06-24T19:33:45 Observation end date RA PNT 15.456620804359 Pointing RA DEC PNT -21.817555326166 Pointing Dec ROLL PNT 115.47909714972 Pointing Roll RA TARG 15.67 Observer’s specified target RA DEC TARG -21.878 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-21T02:15:31 Date and time of file creation DATE-OBS 2002-06-24T06:34:59 Observation start date DATE-END 2002-06-24T19:33:45 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A133 OFFSET Source name TITLE DEEP X-RAY IMAGE OF A133 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 3183 Observation id SEQ NUM 800183 Sequence number RA NOM 15.456620804359 Nominal RA DEC NOM -21.817555326166 Nominal Dec ROLL NOM 115.47909714972 Nominal Roll

Summary Page Created:Wed September 20, 2006 22:17 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800183

Instrument: ACIS Obs ID: 3183 Source: A133 OFFSET PI: Dr. Stephen Murray Title: DEEP X-RAY IMAGE OF A133

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.292389 -21.746063 436.531036 25.595751 17.054825 15.416591 -21.905365 126.636360 13.123995 9.649223 15.447700 -21.876797 103.238640 11.649879 8.861777 15.475337 -21.899820 99.833336 11.712743 8.523480 15.412629 -21.824439 89.142860 11.330015 7.867850 15.383546 -21.902357 93.769997 12.446052 7.534116 15.662279 -21.873852 230.161606 30.818752 7.468233 15.659479 -21.874359 266.000000 35.876007 7.414426 15.368715 -21.799580 79.791664 10.853492 7.351705 15.383188 -21.757492 63.791668 9.999066 6.379763