Summary Page Created:Thu July 20, 2006 14:12 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800232

Instrument: ACIS Obs ID: 3232 Source: NGC 4325 GROUP PI: Professor Trevor Ponman Title: REHEATING IN COOLING FLOWS

acisf03232N002 full img2.fits acisf03232N002 cntr img2.fits

Summary Page Created:Thu July 20, 2006 14:12 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800232

Instrument: ACIS Obs ID: 3232 Source: NGC 4325 GROUP PI: Professor Trevor Ponman Title: REHEATING IN COOLING FLOWS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-20T17:45:32 Date and time of file creation DATE-OBS 2003-02-04T16:10:50 Observation start date DATE-END 2003-02-05T01:07:38 Observation end date RA PNT 185.78772006531 Pointing RA DEC PNT 10.657290858324 Pointing Dec ROLL PNT 77.7794968332 Pointing Roll RA TARG 185.777917 Observer’s specified target RA DEC TARG 10.621194 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-20T18:11:12 Date and time of file creation DATE-OBS 2003-02-04T16:10:50 Observation start date DATE-END 2003-02-05T01:07:38 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-23678 Detector GRATING NONE Grating OBJECT NGC 4325 GROUP Source name TITLE REHEATING IN COOLING FLOWS

Proposal title

OBSERVER Professor Trevor Ponman Principal investigator OBS ID 3232 Observation id SEQ NUM 800232 Sequence number RA NOM 185.78772006531 Nominal RA DEC NOM 10.657290858324 Nominal Dec ROLL NOM 77.7794968332 Nominal Roll

Summary Page Created:Thu July 20, 2006 14:12 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800232

Instrument: ACIS Obs ID: 3232 Source: NGC 4325 GROUP PI: Professor Trevor Ponman Title: REHEATING IN COOLING FLOWS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 185.764719 10.611190 257.386353 18.890589 13.625111 185.793042 10.573946 224.958328 18.014469 12.487647 185.781458 10.580074 243.857147 19.881380 12.265605 185.799745 10.600987 110.875000 12.705460 8.726563 185.821529 10.637248 72.571426 10.848804 6.689349 185.789360 10.783891 58.954544 10.308860 5.718823 185.785564 10.765240 45.487499 9.009524 5.048824 186.052041 10.687576 75.125000 15.926052 4.717113 185.835389 10.741088 38.397728 8.231695 4.664619 185.829287 10.572836 51.545456 11.795102 4.370073