Summary Page Created:Tue September 26, 2006 09:36 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 900140

Instrument: ACIS Obs ID: 3301 Source: H183611 PI: DR. FABIO LA FRANCA Title: A CHEAP COMPLETE WIDE BRIGHT SURVEY

acisf03301N002 full img2.fits acisf03301N002 cntr img2.fits

Summary Page Created:Tue September 26, 2006 09:36 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 900140

Instrument: ACIS Obs ID: 3301 Source: H183611 PI: DR. FABIO LA FRANCA Title: A CHEAP COMPLETE WIDE BRIGHT SURVEY

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-26T13:19:20 Date and time of file creation DATE-OBS 2002-07-24T18:18:37 Observation start date DATE-END 2002-07-24T19:07:07 Observation end date RA PNT 279.05373685569 Pointing RA DEC PNT -65.125792248915 Pointing Dec ROLL PNT 328.18538279586 Pointing Roll RA TARG 279.047083 Observer’s specified target RA DEC TARG -65.122194 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-26T13:35:18 Date and time of file creation DATE-OBS 2002-07-24T18:18:37 Observation start date DATE-END 2002-07-24T19:07:07 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT H183611 Source name TITLE A CHEAP COMPLETE WIDE BRIGHT SURVEY

Proposal title

OBSERVER DR. FABIO LA FRANCA Principal investigator OBS ID 3301 Observation id SEQ NUM 900140 Sequence number RA NOM 279.05373685569 Nominal RA DEC NOM -65.125792248915 Nominal Dec ROLL NOM 328.18538279586 Nominal Roll

Summary Page Created:Tue September 26, 2006 09:36 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 900140

Instrument: ACIS Obs ID: 3301 Source: H183611 PI: DR. FABIO LA FRANCA Title: A CHEAP COMPLETE WIDE BRIGHT SURVEY

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.835448 -65.057272 25.897499 6.770836 3.824860 279.282521 -64.821163 57.084442 16.355999 3.490123 279.344353 -65.070624 20.916666 6.493425 3.221207