Summary Page Created:Thu September 14, 2006 23:44 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 900141

Instrument: ACIS Obs ID: 3302 Source: H220301 PI: DR. FABIO LA FRANCA Title: A CHEAP COMPLETE WIDE BRIGHT SURVEY

acisf03302N002 full img2.fits acisf03302N002 cntr img2.fits

Summary Page Created:Thu September 14, 2006 23:44 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 900141

Instrument: ACIS Obs ID: 3302 Source: H220301 PI: DR. FABIO LA FRANCA Title: A CHEAP COMPLETE WIDE BRIGHT SURVEY

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-15T03:33:03 Date and time of file creation DATE-OBS 2002-05-07T08:15:44 Observation start date DATE-END 2002-05-07T09:25:07 Observation end date RA PNT 330.75200667229 Pointing RA DEC PNT -32.06716442553 Pointing Dec ROLL PNT 113.23939618711 Pointing Roll RA TARG 330.752083 Observer’s specified target RA DEC TARG -32.071667 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-09-15T03:43:45 Date and time of file creation DATE-OBS 2002-05-07T08:15:44 Observation start date DATE-END 2002-05-07T09:25:07 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT H220301 Source name TITLE A CHEAP COMPLETE WIDE BRIGHT SURVEY

Proposal title

OBSERVER DR. FABIO LA FRANCA Principal investigator OBS ID 3302 Observation id SEQ NUM 900141 Sequence number RA NOM 330.75200667229 Nominal RA DEC NOM -32.06716442553 Nominal Dec ROLL NOM 113.23939618711 Nominal Roll

Summary Page Created:Thu September 14, 2006 23:44 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 900141

Instrument: ACIS Obs ID: 3302 Source: H220301 PI: DR. FABIO LA FRANCA Title: A CHEAP COMPLETE WIDE BRIGHT SURVEY

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 330.637296 -32.133711 314.103455 19.784235 15.876451 330.412306 -32.171642 53.956810 15.703814 3.435905 330.435194 -32.217554 51.657806 16.910513 3.054775 330.474082 -32.259240 53.016964 17.622173 3.008537