Summary Page Created:Sat October 14, 2006 18:21 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 400271

Instrument: ACIS Obs ID: 3784 Source: GRB021201 PI: Dr. Kevin Hurley Title: REOLVING THE SHORT GAMMA-RAY BURST MYSTERY

acisf03784N002 full img2.fits acisf03784N002 cntr img2.fits

Summary Page Created:Sat October 14, 2006 18:21 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 400271

Instrument: ACIS Obs ID: 3784 Source: GRB021201 PI: Dr. Kevin Hurley Title: REOLVING THE SHORT GAMMA-RAY BURST MYSTERY

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-14T21:33:39 Date and time of file creation DATE-OBS 2002-12-09T23:10:43 Observation start date DATE-END 2002-12-10T05:15:35 Observation end date RA PNT 121.94483938459 Pointing RA DEC PNT 21.242140339262 Pointing Dec ROLL PNT 79.141383392741 Pointing Roll RA TARG 121.942083 Observer’s specified target RA DEC TARG 21.238306 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-14T22:19:45 Date and time of file creation DATE-OBS 2002-12-09T23:10:43 Observation start date DATE-END 2002-12-10T05:15:35 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT GRB021201 Source name TITLE REOLVING THE SHORT GAMMA-RAY BURST MYSTERY

Proposal title

OBSERVER Dr. Kevin Hurley Principal investigator OBS ID 3784 Observation id SEQ NUM 400271 Sequence number RA NOM 121.94483938459 Nominal RA DEC NOM 21.242140339262 Nominal Dec ROLL NOM 79.141383392741 Nominal Roll

Summary Page Created:Sat October 14, 2006 18:21 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 400271

Instrument: ACIS Obs ID: 3784 Source: GRB021201 PI: Dr. Kevin Hurley Title: REOLVING THE SHORT GAMMA-RAY BURST MYSTERY

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 122.056578 21.102313 2879.510254 58.796436 48.974232 122.056659 21.101914 1901.318237 57.465263 33.086391 122.069144 21.149118 219.704544 18.021120 12.191504 121.602524 21.200277 590.934814 48.565762 12.167726 121.870077 21.170991 167.034088 15.044740 11.102491 121.622217 21.319160 392.355469 41.605125 9.430460 121.956428 21.141961 123.431816 13.767637 8.965360 121.955630 21.209285 90.428574 11.215903 8.062531 121.614621 21.197158 343.597992 49.290405 6.970890 121.621319 21.307211 337.438538 48.967953 6.891007