Summary Page Created:Wed October 18, 2006 14:51 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 400272

Instrument: ACIS Obs ID: 3785 Source: GRB021201 PI: Dr. Kevin Hurley Title: REOLVING THE SHORT GAMMA-RAY BURST MYSTERY

acisf03785N003 full img2.fits acisf03785N003 cntr img2.fits

Summary Page Created:Wed October 18, 2006 14:51 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 400272

Instrument: ACIS Obs ID: 3785 Source: GRB021201 PI: Dr. Kevin Hurley Title: REOLVING THE SHORT GAMMA-RAY BURST MYSTERY

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-18T18:12:57 Date and time of file creation DATE-OBS 2003-01-03T14:41:57 Observation start date DATE-END 2003-01-03T20:40:32 Observation end date RA PNT 121.94467949283 Pointing RA DEC PNT 21.242205339736 Pointing Dec ROLL PNT 81.209006631611 Pointing Roll RA TARG 121.942083 Observer’s specified target RA DEC TARG 21.238306 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-18T18:49:30 Date and time of file creation DATE-OBS 2003-01-03T14:41:57 Observation start date DATE-END 2003-01-03T20:40:32 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT GRB021201 Source name TITLE REOLVING THE SHORT GAMMA-RAY BURST MYSTERY

Proposal title

OBSERVER Dr. Kevin Hurley Principal investigator OBS ID 3785 Observation id SEQ NUM 400272 Sequence number RA NOM 121.94467949283 Nominal RA DEC NOM 21.242205339736 Nominal Dec ROLL NOM 81.209006631611 Nominal Roll

Summary Page Created:Wed October 18, 2006 14:51 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 400272

Instrument: ACIS Obs ID: 3785 Source: GRB021201 PI: Dr. Kevin Hurley Title: REOLVING THE SHORT GAMMA-RAY BURST MYSTERY

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 122.056535 21.102383 4253.662109 69.992165 60.773403 122.056610 21.102017 2920.988525 68.538528 42.618198 122.069235 21.149094 214.147720 17.464306 12.262024 121.870189 21.171085 163.034088 14.901146 10.941044 121.602482 21.192461 474.545227 46.105404 10.292616 121.955613 21.209334 104.428574 11.882428 8.788487 121.621266 21.306869 337.222595 42.061096 8.017447 121.844036 21.180337 92.180000 11.914968 7.736487 121.882394 21.298350 85.571426 11.493361 7.445292 121.956652 21.141825 79.636360 10.988989 7.246924