Summary Page Created:Tue August 8, 2006 19:25 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500331

Instrument: ACIS Obs ID: 3852 Source: KES 27 PI: Frederick Seward Title: OBSERVING THE THERMAL COMPOSITE SNR KES 27

acisf03852N002 full img2.fits acisf03852N002 cntr img2.fits

Summary Page Created:Tue August 8, 2006 19:25 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500331

Instrument: ACIS Obs ID: 3852 Source: KES 27 PI: Frederick Seward Title: OBSERVING THE THERMAL COMPOSITE SNR KES 27

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-08T22:55:24 Date and time of file creation DATE-OBS 2003-06-21T10:56:28 Observation start date DATE-END 2003-06-21T22:23:56 Observation end date RA PNT 237.13339969333 Pointing RA DEC PNT -53.785980335066 Pointing Dec ROLL PNT 313.21043601198 Pointing Roll RA TARG 237.13125 Observer’s specified target RA DEC TARG -53.772222 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-08T23:23:27 Date and time of file creation DATE-OBS 2003-06-21T10:56:28 Observation start date DATE-END 2003-06-21T22:23:56 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT KES 27 Source name TITLE OBSERVING THE THERMAL COMPOSITE SNR KES 27

Proposal title

OBSERVER Frederick Seward Principal investigator OBS ID 3852 Observation id SEQ NUM 500331 Sequence number RA NOM 237.13339969333 Nominal RA DEC NOM -53.785980335066 Nominal Dec ROLL NOM 313.21043601198 Nominal Roll

Summary Page Created:Tue August 8, 2006 19:25 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500331

Instrument: ACIS Obs ID: 3852 Source: KES 27 PI: Frederick Seward Title: OBSERVING THE THERMAL COMPOSITE SNR KES 27

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 237.135292 -53.654552 2107.500000 49.025410 42.987915 237.167531 -53.678782 477.334991 24.476025 19.502146 237.069906 -53.690421 253.431824 18.130890 13.977902 237.123349 -53.774175 123.714287 12.573669 9.839155 237.069740 -53.690273 156.542496 18.867447 8.296963 237.109953 -53.827804 81.857140 11.144309 7.345197 236.908017 -53.777541 87.375000 12.325134 7.089172 237.008687 -53.763715 56.000000 8.864117 6.317606 237.082665 -53.771708 62.571430 10.321786 6.062074 237.221342 -53.801731 54.238636 9.014122 6.017074