Summary Page Created:Fri November 23, 2007 14:42 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500415

Instrument: HRC Obs ID: 4454 Source: XTE J1810-197 PI: Dr. Eric Gotthelf Title: Locating the Transient AXP XTE J1810-197

hrcf04454N003 full img2.fits hrcf04454N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 14:42 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500415

Instrument: HRC Obs ID: 4454 Source: XTE J1810-197 PI: Dr. Eric Gotthelf Title: Locating the Transient AXP XTE J1810-197

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T19:30:03 Date and time of file creation DATE-OBS 2003-08-27T22:27:41 Observation start date DATE-END 2003-08-27T23:39:31 Observation end date RA PNT 272.723232283 Pointing RA DEC PNT -19.703759368381 Pointing Dec ROLL PNT 268.99036464508 Pointing Roll RA TARG 272.725 Observer’s specified target RA DEC TARG -19.7 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T19:41:08 Date and time of file creation DATE-OBS 2003-08-27T22:27:41 Observation start date DATE-END 2003-08-27T23:39:31 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT XTE J1810-197 Source name TITLE Locating the Transient AXP XTE J1810-197

Proposal title

OBSERVER Dr. Eric Gotthelf Principal investigator OBS ID 4454 Observation id SEQ NUM 500415 Sequence number RA NOM 272.723232283 Nominal RA DEC NOM -19.703759368381 Nominal Dec ROLL NOM 268.99036464508 Nominal Roll

Summary Page Created:Fri November 23, 2007 14:42 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500415

Instrument: HRC Obs ID: 4454 Source: XTE J1810-197 PI: Dr. Eric Gotthelf Title: Locating the Transient AXP XTE J1810-197

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 272.462737 -19.730726 2052.958252 54.444645 37.707260 272.541271 -19.878690 80.750000 20.148739 4.007695 272.655230 -19.414323 110.414284 27.751631 3.978659 273.050240 -19.665225 105.639282 26.617842 3.968740 272.925357 -19.671651 51.750000 14.392944 3.595512 273.051196 -19.741199 97.386604 27.467312 3.545546 272.700826 -19.380936 115.435219 33.262562 3.470425 272.791060 -19.978487 81.916664 23.710468 3.454873 272.499905 -19.554372 64.834480 18.890091 3.432196 272.676451 -19.395785 92.635712 27.706459 3.343470