Summary Page Created:Fri November 23, 2007 16:29 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500498

Instrument: HRC Obs ID: 5240 Source: XTE J1810-197 PI: Dr GianLuca Israel Title: Unveiling the multiwavelength spectrum of the AXP XTEJ1810-197

hrcf05240N003 full img2.fits hrcf05240N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 16:29 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500498

Instrument: HRC Obs ID: 5240 Source: XTE J1810-197 PI: Dr GianLuca Israel Title: Unveiling the multiwavelength spectrum of the AXP XTEJ1810-197

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T21:17:06 Date and time of file creation DATE-OBS 2003-11-01T15:10:29 Observation start date DATE-END 2003-11-01T16:40:12 Observation end date RA PNT 272.4615001554 Pointing RA DEC PNT -19.735425633224 Pointing Dec ROLL PNT 273.65549798452 Pointing Roll RA TARG 272.462917 Observer’s specified target RA DEC TARG -19.731028 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T21:28:38 Date and time of file creation DATE-OBS 2003-11-01T15:10:29 Observation start date DATE-END 2003-11-01T16:40:12 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT XTE J1810-197 Source name TITLE Unveiling the multiwavelength spectrum of the AXP XTEJ1810-197 Pro

OBSERVER Dr GianLuca Israel Principal investigator OBS ID 5240 Observation id SEQ NUM 500498 Sequence number RA NOM 272.4615001554 Nominal RA DEC NOM -19.735425633224 Nominal Dec ROLL NOM 273.65549798452 Nominal Roll

Summary Page Created:Fri November 23, 2007 16:29 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500498

Instrument: HRC Obs ID: 5240 Source: XTE J1810-197 PI: Dr GianLuca Israel Title: Unveiling the multiwavelength spectrum of the AXP XTEJ1810-197

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 272.462854 -19.731041 2974.041748 58.015972 51.262466 272.488659 -19.426069 74.930359 20.062004 3.734939 272.768755 -19.658721 70.736610 19.584253 3.611912 272.746477 -19.803317 51.570629 15.678883 3.289178 272.647306 -19.909820 42.291668 12.871642 3.285647 272.492456 -20.028656 65.333336 20.308201 3.217091 272.803843 -19.733102 66.538208 21.547117 3.088033 272.505157 -19.442483 59.625000 19.754822 3.018250