Summary Page Created:Mon February 12, 2007 18:01 EST page: 1 of 3

Chandra X-ray Center Seq Num: 700654

Instrument: ACIS Obs ID: 3975 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

acisf03975N003 full img2.fits acisf03975N003 cntr img2.fits

Summary Page Created:Mon February 12, 2007 18:01 EST page: 2 of 3

Chandra X-ray Center Seq Num: 700654

Instrument: ACIS Obs ID: 3975 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-02-12T22:40:36 Date and time of file creation DATE-OBS 2002-11-17T02:25:39 Observation start date DATE-END 2002-11-17T04:21:06 Observation end date RA PNT 187.71282017001 Pointing RA DEC PNT 12.400916844716 Pointing Dec ROLL PNT 55.26268476289 Pointing Roll RA TARG 187.704167 Observer’s specified target RA DEC TARG 12.391667 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-02-12T22:59:39 Date and time of file creation DATE-OBS 2002-11-17T02:25:39 Observation start date DATE-END 2002-11-17T04:21:06 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT M87 Source name TITLE X-RAY VARIABILITY IN THE JET AND CORE OF M87

Proposal title

OBSERVER Dr. Daniel Harris Principal investigator OBS ID 3975 Observation id SEQ NUM 700654 Sequence number RA NOM 187.71282017001 Nominal RA DEC NOM 12.400916844716 Nominal Dec ROLL NOM 55.26268476289 Nominal Roll

Summary Page Created:Mon February 12, 2007 18:01 EST page: 3 of 3

Chandra X-ray Center Seq Num: 700654

Instrument: ACIS Obs ID: 3975 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 187.705810 12.391199 5173.143066 81.356758 63.585903 187.702570 12.392379 1340.142822 44.624321 30.031670 187.705127 12.391412 317.285706 37.990158 8.351787 187.704408 12.391661 209.714279 25.760723 8.140854 187.701052 12.393049 93.142860 19.764879 4.712544 187.719539 12.399552 27.857143 7.942266 3.507456 187.695227 12.384848 29.142857 9.332203 3.122827 187.689033 12.364829 23.857143 7.639983 3.122670 187.684611 12.359221 28.670454 9.533696 3.007276