Summary Page Created:Mon October 16, 2006 00:56 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700655

Instrument: ACIS Obs ID: 3976 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

acisf03976N002 full img2.fits acisf03976N002 cntr img2.fits

Summary Page Created:Mon October 16, 2006 00:56 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700655

Instrument: ACIS Obs ID: 3976 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-16T04:27:47 Date and time of file creation DATE-OBS 2002-12-29T14:13:52 Observation start date DATE-END 2002-12-29T16:04:35 Observation end date RA PNT 187.71059409424 Pointing RA DEC PNT 12.402489905717 Pointing Dec ROLL PNT 67.493316611644 Pointing Roll RA TARG 187.704167 Observer’s specified target RA DEC TARG 12.391667 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-16T04:55:32 Date and time of file creation DATE-OBS 2002-12-29T14:13:52 Observation start date DATE-END 2002-12-29T16:04:35 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT M87 Source name TITLE X-RAY VARIABILITY IN THE JET AND CORE OF M87

Proposal title

OBSERVER Dr. Daniel Harris Principal investigator OBS ID 3976 Observation id SEQ NUM 700655 Sequence number RA NOM 187.71059409424 Nominal RA DEC NOM 12.402489905717 Nominal Dec ROLL NOM 67.493316611644 Nominal Roll

Summary Page Created:Mon October 16, 2006 00:56 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700655

Instrument: ACIS Obs ID: 3976 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 187.705762 12.391206 4387.856934 74.348061 59.017776 187.702537 12.392357 1230.285767 42.948463 28.645628 187.711652 12.417232 45.142857 8.894440 5.075402 187.703901 12.391812 118.285713 23.681242 4.994912 187.701046 12.393126 94.857140 19.317762 4.910359 187.701338 12.388873 39.714287 11.889598 3.340255 187.700310 12.381949 27.428572 9.025147 3.039127