Summary Page Created:Thu July 20, 2006 13:27 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700656

Instrument: ACIS Obs ID: 3977 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

acisf03977N002 full img2.fits acisf03977N002 cntr img2.fits

Summary Page Created:Thu July 20, 2006 13:27 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700656

Instrument: ACIS Obs ID: 3977 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-20T16:57:36 Date and time of file creation DATE-OBS 2003-02-04T14:22:12 Observation start date DATE-END 2003-02-04T16:10:50 Observation end date RA PNT 187.70820917836 Pointing RA DEC PNT 12.403417690477 Pointing Dec ROLL PNT 79.269563791361 Pointing Roll RA TARG 187.704167 Observer’s specified target RA DEC TARG 12.391667 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-20T17:26:13 Date and time of file creation DATE-OBS 2003-02-04T14:22:12 Observation start date DATE-END 2003-02-04T16:10:50 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT M87 Source name TITLE X-RAY VARIABILITY IN THE JET AND CORE OF M87

Proposal title

OBSERVER Dr. Daniel Harris Principal investigator OBS ID 3977 Observation id SEQ NUM 700656 Sequence number RA NOM 187.70820917836 Nominal RA DEC NOM 12.403417690477 Nominal Dec ROLL NOM 79.269563791361 Nominal Roll

Summary Page Created:Thu July 20, 2006 13:27 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700656

Instrument: ACIS Obs ID: 3977 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 187.705751 12.391146 4496.714355 78.220177 57.487911 187.702587 12.392279 1263.000000 43.373264 29.119322 187.704967 12.391391 229.000000 36.806763 6.221683 187.704055 12.391697 148.428574 25.422558 5.838459 187.701164 12.393002 89.142860 19.656139 4.535115 187.703516 12.391906 91.142860 22.366991 4.074883 187.711609 12.417133 38.714287 9.526475 4.063863 187.708791 12.383440 37.142857 11.006064 3.374763 187.698728 12.392757 45.428570 14.088442 3.224528