Summary Page Created:Thu August 10, 2006 04:41 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700660

Instrument: ACIS Obs ID: 3981 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

acisf03981N002 full img2.fits acisf03981N002 cntr img2.fits

Summary Page Created:Thu August 10, 2006 04:41 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700660

Instrument: ACIS Obs ID: 3981 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-10T08:15:38 Date and time of file creation DATE-OBS 2003-07-03T09:13:36 Observation start date DATE-END 2003-07-03T10:55:37 Observation end date RA PNT 187.69792768738 Pointing RA DEC PNT 12.380877714478 Pointing Dec ROLL PNT 248.40666776115 Pointing Roll RA TARG 187.704167 Observer’s specified target RA DEC TARG 12.391667 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-10T08:39:53 Date and time of file creation DATE-OBS 2003-07-03T09:13:36 Observation start date DATE-END 2003-07-03T10:55:37 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT M87 Source name TITLE X-RAY VARIABILITY IN THE JET AND CORE OF M87

Proposal title

OBSERVER Dr. Daniel Harris Principal investigator OBS ID 3981 Observation id SEQ NUM 700660 Sequence number RA NOM 187.69792768738 Nominal RA DEC NOM 12.380877714478 Nominal Dec ROLL NOM 248.40666776115 Nominal Roll

Summary Page Created:Thu August 10, 2006 04:41 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700660

Instrument: ACIS Obs ID: 3981 Source: M87 PI: Dr. Daniel Harris Title: X-RAY VARIABILITY IN THE JET AND CORE OF M87

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 187.705818 12.391280 4294.285645 75.462044 56.906567 187.702668 12.392402 1014.000000 40.585445 24.984327 187.705047 12.391533 233.285721 34.085732 6.844087 187.704406 12.391759 115.428574 24.276953 4.754656 187.703799 12.391882 103.000000 21.934353 4.695830 187.701268 12.392983 87.142860 19.601515 4.445721 187.711649 12.417277 30.285715 8.579084 3.530180 187.705477 12.392940 58.857143 18.287516 3.218433 187.702406 12.397827 40.428570 13.016474 3.105954 187.696442 12.404600 22.142857 7.235219 3.060426