Summary Page Created:Mon July 24, 2006 14:00 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700717

Instrument: ACIS Obs ID: 4038 Source: 2MASS104943+583750 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

acisf04038N002 full img2.fits acisf04038N002 cntr img2.fits

Summary Page Created:Mon July 24, 2006 14:00 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700717

Instrument: ACIS Obs ID: 4038 Source: 2MASS104943+583750 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-24T17:33:39 Date and time of file creation DATE-OBS 2003-03-16T19:02:15 Observation start date DATE-END 2003-03-16T20:43:13 Observation end date RA PNT 162.41223108897 Pointing RA DEC PNT 58.629636034581 Pointing Dec ROLL PNT 196.37836636922 Pointing Roll RA TARG 162.430833 Observer’s specified target RA DEC TARG 58.630667 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-24T17:58:56 Date and time of file creation DATE-OBS 2003-03-16T19:02:15 Observation start date DATE-END 2003-03-16T20:43:13 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT 2MASS104943+583750 Source name TITLE WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Proposal title

OBSERVER Dr. BELINDA WILKES Principal investigator OBS ID 4038 Observation id SEQ NUM 700717 Sequence number RA NOM 162.41223108897 Nominal RA DEC NOM 58.629636034581 Nominal Dec ROLL NOM 196.37836636922 Nominal Roll

Summary Page Created:Mon July 24, 2006 14:00 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700717

Instrument: ACIS Obs ID: 4038 Source: 2MASS104943+583750 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 162.430606 58.630715 146.571426 14.093799 10.399711 161.885625 58.484780 123.239204 23.772774 5.184048 161.930691 58.488052 97.291664 21.185040 4.592471 161.845992 58.604262 105.172325 24.503969 4.292052 161.875257 58.498154 93.787376 24.068512 3.896684 162.119116 58.515209 42.916668 11.397690 3.765383 161.822535 58.600890 84.099670 24.299698 3.460935 161.849170 58.543758 80.787376 23.780823 3.397165 161.835102 58.574815 75.393753 24.192205 3.116448 162.060860 58.621953 33.465908 10.811468 3.095408