Summary Page Created:Sat October 14, 2006 17:29 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700720

Instrument: ACIS Obs ID: 4041 Source: 2MASS124349-080248 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

acisf04041N002 full img2.fits acisf04041N002 cntr img2.fits

Summary Page Created:Sat October 14, 2006 17:29 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700720

Instrument: ACIS Obs ID: 4041 Source: 2MASS124349-080248 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-14T21:01:56 Date and time of file creation DATE-OBS 2002-12-09T06:21:33 Observation start date DATE-END 2002-12-09T07:50:29 Observation end date RA PNT 190.96088953859 Pointing RA DEC PNT -8.0385387438642 Pointing Dec ROLL PNT 68.647252283902 Pointing Roll RA TARG 190.955833 Observer’s specified target RA DEC TARG -8.046722 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-14T21:28:23 Date and time of file creation DATE-OBS 2002-12-09T06:21:33 Observation start date DATE-END 2002-12-09T07:50:29 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT 2MASS124349-080248 Source name TITLE WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Proposal title

OBSERVER Dr. BELINDA WILKES Principal investigator OBS ID 4041 Observation id SEQ NUM 700720 Sequence number RA NOM 190.96088953859 Nominal RA DEC NOM -8.0385387438642 Nominal Dec ROLL NOM 68.647252283902 Nominal Roll

Summary Page Created:Sat October 14, 2006 17:29 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700720

Instrument: ACIS Obs ID: 4041 Source: 2MASS124349-080248 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 190.955605 -8.046792 153.285721 14.477119 10.588137 191.014487 -7.732222 140.774094 23.811140 5.912110 190.902601 -8.081656 37.714287 7.891706 4.778977 191.039632 -7.739142 115.342194 26.040285 4.429375 191.010087 -7.743953 110.449104 25.026970 4.413203 191.119013 -7.771067 105.591362 27.441555 3.847864 191.130692 -7.776502 88.328903 24.244755 3.643217 191.039741 -7.889687 27.062069 8.163073 3.315182 191.109824 -8.185499 28.387501 8.886997 3.194274 191.118454 -7.779362 86.635712 27.592489 3.139830