Summary Page Created:Tue July 11, 2006 04:16 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700723

Instrument: ACIS Obs ID: 4044 Source: 2MASS141850+680410 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

acisf04044N002 full img2.fits acisf04044N002 cntr img2.fits

Summary Page Created:Tue July 11, 2006 04:16 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700723

Instrument: ACIS Obs ID: 4044 Source: 2MASS141850+680410 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T08:04:57 Date and time of file creation DATE-OBS 2003-08-18T04:58:37 Observation start date DATE-END 2003-08-18T06:34:44 Observation end date RA PNT 214.71114584628 Pointing RA DEC PNT 68.059629372888 Pointing Dec ROLL PNT 286.15750947139 Pointing Roll RA TARG 214.708333 Observer’s specified target RA DEC TARG 68.069333 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 155.220047 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T08:15:44 Date and time of file creation DATE-OBS 2003-08-18T04:58:37 Observation start date DATE-END 2003-08-18T06:34:44 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT 2MASS141850+680410 Source name TITLE WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Proposal title

OBSERVER Dr. BELINDA WILKES Principal investigator OBS ID 4044 Observation id SEQ NUM 700723 Sequence number RA NOM 214.71114584628 Nominal RA DEC NOM 68.059629372888 Nominal Dec ROLL NOM 286.15750947139 Nominal Roll

Summary Page Created:Tue July 11, 2006 04:16 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700723

Instrument: ACIS Obs ID: 4044 Source: 2MASS141850+680410 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 214.707902 68.069368 525.000000 25.102192 20.914509 215.089000 67.784919 101.657806 18.434978 5.514398 214.780490 67.752679 91.295685 20.865492 4.375439 214.088512 67.961977 40.068966 9.168075 4.370488 214.445299 67.956193 26.159090 6.816224 3.837769 215.023788 67.777861 76.697678 22.393404 3.425012 214.866826 67.759071 69.607971 20.830254 3.341677 214.963850 67.772584 65.317856 20.520088 3.183118 214.987073 67.773115 63.843853 21.255520 3.003636