Summary Page Created:Fri August 11, 2006 23:43 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700726

Instrument: ACIS Obs ID: 4047 Source: 2MASS151141+051810 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

acisf04047N003 full img2.fits acisf04047N003 cntr img2.fits

Summary Page Created:Fri August 11, 2006 23:43 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700726

Instrument: ACIS Obs ID: 4047 Source: 2MASS151141+051810 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-12T03:19:49 Date and time of file creation DATE-OBS 2003-05-18T11:20:04 Observation start date DATE-END 2003-05-18T12:28:04 Observation end date RA PNT 227.91258043571 Pointing RA DEC PNT 5.3018229354565 Pointing Dec ROLL PNT 195.22836388024 Pointing Roll RA TARG 227.922083 Observer’s specified target RA DEC TARG 5.302639 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-12T03:41:45 Date and time of file creation DATE-OBS 2003-05-18T11:20:04 Observation start date DATE-END 2003-05-18T12:28:04 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT 2MASS151141+051810 Source name TITLE WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Proposal title

OBSERVER Dr. BELINDA WILKES Principal investigator OBS ID 4047 Observation id SEQ NUM 700726 Sequence number RA NOM 227.91258043571 Nominal RA DEC NOM 5.3018229354565 Nominal Dec ROLL NOM 195.22836388024 Nominal Roll

Summary Page Created:Fri August 11, 2006 23:43 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700726

Instrument: ACIS Obs ID: 4047 Source: 2MASS151141+051810 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 227.921958 5.302585 48.714287 8.655478 5.628145 227.616521 5.283993 79.186607 16.613768 4.766325 227.604792 5.281545 64.033226 15.971770 4.009150 227.687797 5.308459 36.785240 10.155221 3.622298