Summary Page Created:Sun October 22, 2006 13:17 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700730

Instrument: ACIS Obs ID: 4051 Source: 2MASS202551-495813 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

acisf04051N003 full img2.fits acisf04051N003 cntr img2.fits

Summary Page Created:Sun October 22, 2006 13:17 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700730

Instrument: ACIS Obs ID: 4051 Source: 2MASS202551-495813 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-22T17:06:50 Date and time of file creation DATE-OBS 2002-12-07T16:07:46 Observation start date DATE-END 2002-12-07T17:25:55 Observation end date RA PNT 306.45525933997 Pointing RA DEC PNT -49.978882861525 Pointing Dec ROLL PNT 256.06388716545 Pointing Roll RA TARG 306.46125 Observer’s specified target RA DEC TARG -49.970222 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-22T17:16:19 Date and time of file creation DATE-OBS 2002-12-07T16:07:46 Observation start date DATE-END 2002-12-07T17:25:55 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT 2MASS202551-495813 Source name TITLE WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Proposal title

OBSERVER Dr. BELINDA WILKES Principal investigator OBS ID 4051 Observation id SEQ NUM 700730 Sequence number RA NOM 306.45525933997 Nominal RA DEC NOM -49.978882861525 Nominal Dec ROLL NOM 256.06388716545 Nominal Roll

Summary Page Created:Sun October 22, 2006 13:17 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700730

Instrument: ACIS Obs ID: 4051 Source: 2MASS202551-495813 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 306.461460 -49.970272 185.857147 15.399851 12.068763 306.251753 -50.259985 96.983391 20.487452 4.733795 306.258684 -49.826928 43.249107 9.183848 4.709258 306.276640 -49.837809 29.318182 7.411719 3.955652 306.259159 -49.827906 34.458332 9.368357 3.678162 306.321998 -50.272731 75.225914 21.258450 3.538636 306.532807 -49.961711 22.079546 6.250462 3.532466 306.415815 -50.249242 67.215912 19.183117 3.503910 306.394265 -50.284869 70.524918 20.148264 3.500297 306.259108 -49.842218 23.318182 6.917390 3.370951