Summary Page Created:Wed July 5, 2006 21:11 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700731

Instrument: ACIS Obs ID: 4052 Source: 2MASS222221+195947 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

acisf04052N002 full img2.fits acisf04052N002 cntr img2.fits

Summary Page Created:Wed July 5, 2006 21:11 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700731

Instrument: ACIS Obs ID: 4052 Source: 2MASS222221+195947 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-06T00:47:54 Date and time of file creation DATE-OBS 2003-09-04T10:10:19 Observation start date DATE-END 2003-09-04T11:45:56 Observation end date RA PNT 335.57786064319 Pointing RA DEC PNT 19.995551976486 Pointing Dec ROLL PNT 195.4823746766 Pointing Roll RA TARG 335.587917 Observer’s specified target RA DEC TARG 19.9965 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-06T01:10:06 Date and time of file creation DATE-OBS 2003-09-04T10:10:19 Observation start date DATE-END 2003-09-04T11:45:56 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT 2MASS222221+195947 Source name TITLE WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Proposal title

OBSERVER Dr. BELINDA WILKES Principal investigator OBS ID 4052 Observation id SEQ NUM 700731 Sequence number RA NOM 335.57786064319 Nominal RA DEC NOM 19.995551976486 Nominal Dec ROLL NOM 195.4823746766 Nominal Roll

Summary Page Created:Wed July 5, 2006 21:11 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700731

Instrument: ACIS Obs ID: 4052 Source: 2MASS222221+195947 PI: Dr. BELINDA WILKES Title: WHY DO WE SEE BROAD LINES IN X-RAY ABSORBED AGN?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 335.626454 20.039902 45.159092 8.279939 5.454037 335.640870 19.971329 37.079544 7.534678 4.921185 335.588045 19.996567 38.142857 8.430956 4.524144 335.250863 19.974344 92.684387 21.356493 4.339869 335.289083 19.985009 72.034088 17.223377 4.182344 335.281807 19.983665 75.416664 19.064812 3.955805 335.285029 19.857833 80.691032 21.784279 3.704095 335.258438 19.936233 72.920265 21.426039 3.403348 335.349869 19.888269 48.098038 15.463387 3.110446 335.253015 19.949835 59.059799 19.409924 3.042763