Summary Page Created:Mon August 7, 2006 00:05 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700761

Instrument: ACIS Obs ID: 4082 Source: SDSS J022756.28+005733.1 PI: Prof RICHARD POGGE Title: ARE ALL NARROW-LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

acisf04082N002 full img2.fits acisf04082N002 cntr img2.fits

Summary Page Created:Mon August 7, 2006 00:05 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700761

Instrument: ACIS Obs ID: 4082 Source: SDSS J022756.28+005733.1 PI: Prof RICHARD POGGE Title: ARE ALL NARROW-LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-07T03:24:23 Date and time of file creation DATE-OBS 2003-06-17T13:13:05 Observation start date DATE-END 2003-06-17T14:04:33 Observation end date RA PNT 37.003161247888 Pointing RA DEC PNT 1.0315965795185 Pointing Dec ROLL PNT 119.43566067954 Pointing Roll RA TARG 36.984583 Observer’s specified target RA DEC TARG 0.959194 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-07T04:04:10 Date and time of file creation DATE-OBS 2003-06-17T13:13:05 Observation start date DATE-END 2003-06-17T14:04:33 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT SDSS J022756.28+005733.1 Source name TITLE ARE ALL NARROW- LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

Proposal t

OBSERVER Prof RICHARD POGGE Principal investigator OBS ID 4082 Observation id SEQ NUM 700761 Sequence number RA NOM 37.003161247888 Nominal RA DEC NOM 1.0315965795185 Nominal Dec ROLL NOM 119.43566067954 Nominal Roll

Summary Page Created:Mon August 7, 2006 00:05 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700761

Instrument: ACIS Obs ID: 4082 Source: SDSS J022756.28+005733.1 PI: Prof RICHARD POGGE Title: ARE ALL NARROW-LINE SEYFERT 1S ULTRASOFT X-RAY SOURCES?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 36.801402 1.262156 70.810631 17.371840 4.076173 37.170999 0.868372 32.313725 8.305336 3.890719 36.833640 1.285540 66.657806 17.383718 3.834497 36.984523 0.959232 26.428572 7.303443 3.618646 36.839890 1.284352 54.601788 16.760254 3.257814 36.919595 1.277596 49.522728 15.347568 3.226748 36.920278 1.276490 45.420689 14.345789 3.166134