Summary Page Created:Wed July 5, 2006 05:44 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800350

Instrument: ACIS Obs ID: 4194 Source: NGC 6338 PI: Professor Trevor Ponman Title: ENTROPY FLUCTUATIONS IN GALAXY GROUPS

acisf04194N002 full img2.fits acisf04194N002 cntr img2.fits

Summary Page Created:Wed July 5, 2006 05:44 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800350

Instrument: ACIS Obs ID: 4194 Source: NGC 6338 PI: Professor Trevor Ponman Title: ENTROPY FLUCTUATIONS IN GALAXY GROUPS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-05T09:11:21 Date and time of file creation DATE-OBS 2003-09-17T08:34:41 Observation start date DATE-END 2003-09-17T22:25:35 Observation end date RA PNT 258.84255833 Pointing RA DEC PNT 57.406750877943 Pointing Dec ROLL PNT 273.66908557287 Pointing Roll RA TARG 258.845417 Observer’s specified target RA DEC TARG 57.411111 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-05T09:42:40 Date and time of file creation DATE-OBS 2003-09-17T08:34:41 Observation start date DATE-END 2003-09-17T22:25:35 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT NGC 6338 Source name TITLE ENTROPY FLUCTUATIONS IN GALAXY GROUPS

Proposal title

OBSERVER Professor Trevor Ponman Principal investigator OBS ID 4194 Observation id SEQ NUM 800350 Sequence number RA NOM 258.84255833 Nominal RA DEC NOM 57.406750877943 Nominal Dec ROLL NOM 273.66908557287 Nominal Roll

Summary Page Created:Wed July 5, 2006 05:44 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800350

Instrument: ACIS Obs ID: 4194 Source: NGC 6338 PI: Professor Trevor Ponman Title: ENTROPY FLUCTUATIONS IN GALAXY GROUPS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 258.737442 57.446759 531.428589 25.829786 20.574253 259.413145 57.406111 754.710938 51.644978 14.613443 259.397253 57.525812 795.317139 60.055630 13.243008 258.571181 57.517527 307.568176 25.574373 12.026422 259.010958 57.457449 152.872498 14.708147 10.393729 258.633368 57.365574 150.193100 15.697355 9.568051 259.403286 57.490727 605.056458 63.760311 9.489547 258.650790 57.475454 130.352280 13.964337 9.334655 259.403011 57.510585 506.295685 60.478172 8.371544 259.207276 57.419960 281.833344 34.725433 8.116050