Summary Page Created:Tue July 11, 2006 05:12 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800363

Instrument: ACIS Obs ID: 4207 Source: HCG80 PI: Dr. Naomi Ota Title: DOES A SPIRAL-ONLY COMPACT GROUP HAVE DIFFUSE GAS?

acisf04207N002 full img2.fits acisf04207N002 cntr img2.fits

Summary Page Created:Tue July 11, 2006 05:12 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800363

Instrument: ACIS Obs ID: 4207 Source: HCG80 PI: Dr. Naomi Ota Title: DOES A SPIRAL-ONLY COMPACT GROUP HAVE DIFFUSE GAS?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T08:44:59 Date and time of file creation DATE-OBS 2003-08-18T06:34:44 Observation start date DATE-END 2003-08-18T12:41:23 Observation end date RA PNT 239.79045310364 Pointing RA DEC PNT 65.205592820966 Pointing Dec ROLL PNT 262.16819258717 Pointing Roll RA TARG 239.80125 Observer’s specified target RA DEC TARG 65.225833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-07-11T09:10:37 Date and time of file creation DATE-OBS 2003-08-18T06:34:44 Observation start date DATE-END 2003-08-18T12:41:23 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT HCG80 Source name TITLE DOES A SPIRAL-ONLY COM- PACT GROUP HAVE DIFFUSE GAS?

Proposal title

OBSERVER Dr. Naomi Ota Principal investigator OBS ID 4207 Observation id SEQ NUM 800363 Sequence number RA NOM 239.79045310364 Nominal RA DEC NOM 65.205592820966 Nominal Dec ROLL NOM 262.16819258717 Nominal Roll

Summary Page Created:Tue July 11, 2006 05:12 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800363

Instrument: ACIS Obs ID: 4207 Source: HCG80 PI: Dr. Naomi Ota Title: DOES A SPIRAL-ONLY COMPACT GROUP HAVE DIFFUSE GAS?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 239.731662 65.346818 382.988647 21.894022 17.492842 239.840100 65.222995 284.571442 18.601004 15.298714 239.835634 64.898051 410.023254 40.470230 10.131478 239.745224 64.992998 336.548187 33.900921 9.927404 239.547845 64.911616 339.504974 36.146587 9.392449 239.662521 65.269735 99.625000 12.253288 8.130470 239.596517 65.082887 102.670456 13.156202 7.803958 239.721570 65.077286 80.250000 12.310649 6.518746 239.806346 64.898158 277.651154 43.666981 6.358377 239.551809 64.928903 240.323212 40.267006 5.968241