Summary Page Created:Mon June 26, 2006 13:09 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 4468 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

acisf04468N002 full img2.fits acisf04468N002 cntr img2.fits

Summary Page Created:Mon June 26, 2006 13:09 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 4468 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T16:57:36 Date and time of file creation DATE-OBS 2003-11-24T04:13:17 Observation start date DATE-END 2003-11-24T04:54:47 Observation end date RA PNT 288.37436650861 Pointing RA DEC PNT 17.323405794491 Pointing Dec ROLL PNT 314.14787482774 Pointing Roll RA TARG 288.34466 Observer’s specified target RA DEC TARG 17.3552 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T17:08:48 Date and time of file creation DATE-OBS 2003-11-24T04:13:17 Observation start date DATE-END 2003-11-24T04:54:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-023678 Detector GRATING NONE Grating OBJECT 2P/Encke (2003) Source name TITLE High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Proposal title

OBSERVER Dr. Carey Lisse Principal investigator OBS ID 4468 Observation id SEQ NUM 100051 Sequence number RA NOM 288.37436650861 Nominal RA DEC NOM 17.323405794491 Nominal Dec ROLL NOM 314.14787482774 Nominal Roll

Summary Page Created:Mon June 26, 2006 13:09 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 4468 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 288.281481 17.512817 36.770763 8.031704 4.578202 288.236910 17.463758 27.583334 8.489096 3.249266 288.213215 17.443180 24.708334 7.793028 3.170569 288.222736 17.451571 22.791666 7.280236 3.130622 288.280644 17.470857 22.041380 7.296712 3.020728