Summary Page Created:Mon June 26, 2006 13:11 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5254 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

acisf05254N002 full img2.fits acisf05254N002 cntr img2.fits

Summary Page Created:Mon June 26, 2006 13:11 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5254 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T17:00:46 Date and time of file creation DATE-OBS 2003-11-24T05:24:47 Observation start date DATE-END 2003-11-24T05:54:47 Observation end date RA PNT 288.28801655479 Pointing RA DEC PNT 17.245448320901 Pointing Dec ROLL PNT 314.14777841564 Pointing Roll RA TARG 288.2581 Observer’s specified target RA DEC TARG 17.27738 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T17:10:06 Date and time of file creation DATE-OBS 2003-11-24T05:24:47 Observation start date DATE-END 2003-11-24T05:54:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-023678 Detector GRATING NONE Grating OBJECT 2P/Encke (2003) Source name TITLE High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Proposal title

OBSERVER Dr. Carey Lisse Principal investigator OBS ID 5254 Observation id SEQ NUM 100051 Sequence number RA NOM 288.28801655479 Nominal RA DEC NOM 17.245448320901 Nominal Dec ROLL NOM 314.14777841564 Nominal Roll

Summary Page Created:Mon June 26, 2006 13:11 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5254 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 288.108974 17.349997 35.387501 9.327848 3.793747 288.110105 17.348675 30.708334 8.230168 3.731191 288.111181 17.409677 29.431372 8.521459 3.453795 288.117645 17.357394 23.833334 7.172354 3.322944 288.122675 17.328194 20.238636 6.465486 3.130258 288.142416 17.379616 26.541666 8.571662 3.096443 288.157687 17.359424 21.027586 6.846082 3.071477 288.124092 17.366190 21.791666 7.198172 3.027389 288.099151 17.338693 21.138393 7.000687 3.019474