Summary Page Created:Mon June 26, 2006 13:22 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5255 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

acisf05255N002 full img2.fits acisf05255N002 cntr img2.fits

Summary Page Created:Mon June 26, 2006 13:22 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5255 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T17:08:34 Date and time of file creation DATE-OBS 2003-11-24T05:54:47 Observation start date DATE-END 2003-11-24T06:24:48 Observation end date RA PNT 288.24485921662 Pointing RA DEC PNT 17.206369875763 Pointing Dec ROLL PNT 314.14770299691 Pointing Roll RA TARG 288.21467 Observer’s specified target RA DEC TARG 17.2387 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T17:21:14 Date and time of file creation DATE-OBS 2003-11-24T05:54:47 Observation start date DATE-END 2003-11-24T06:24:48 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-023678 Detector GRATING NONE Grating OBJECT 2P/Encke (2003) Source name TITLE High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Proposal title

OBSERVER Dr. Carey Lisse Principal investigator OBS ID 5255 Observation id SEQ NUM 100051 Sequence number RA NOM 288.24485921662 Nominal RA DEC NOM 17.206369875763 Nominal Dec ROLL NOM 314.14770299691 Nominal Roll

Summary Page Created:Mon June 26, 2006 13:22 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 100051

Instrument: ACIS Obs ID: 5255 Source: 2P/Encke (2003) PI: Dr. Carey Lisse Title: High Resolution Imaging of the Source of Comet Encke’s X-Rays Over One Nuclear Rotation

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 288.069408 17.314183 29.083036 7.303956 3.981820 288.159762 17.363600 34.875000 8.768601 3.977259 288.095426 17.303631 26.013794 6.887909 3.776733 288.150205 17.387066 30.249107 8.332272 3.630356 288.088427 17.386936 27.352942 8.097071 3.378128 288.068899 17.278203 21.238636 6.557864 3.238652 288.148465 17.352571 28.117241 9.331685 3.013094