Summary Page Created:Thu May 18, 2006 21:23 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 400365

Instrument: ACIS Obs ID: 4583 Source: 4U 1730-22 PI: Dr. John Tomsick Title: Localizing the X-Ray Transient 4U 1730-22

acisf04583N002 full img2.fits acisf04583N002 cntr img2.fits

Summary Page Created:Thu May 18, 2006 21:23 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 400365

Instrument: ACIS Obs ID: 4583 Source: 4U 1730-22 PI: Dr. John Tomsick Title: Localizing the X-Ray Transient 4U 1730-22

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-19T00:30:22 Date and time of file creation DATE-OBS 2004-05-11T05:48:02 Observation start date DATE-END 2004-05-11T17:35:45 Observation end date RA PNT 263.4896146013 Pointing RA DEC PNT -22.009111850144 Pointing Dec ROLL PNT 89.489543173702 Pointing Roll RA TARG 263.4875 Observer’s specified target RA DEC TARG -22.035278 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-19T01:21:43 Date and time of file creation DATE-OBS 2004-05-11T05:48:02 Observation start date DATE-END 2004-05-11T17:35:45 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT 4U 1730-22 Source name TITLE Localizing the X-Ray Transient 4U 1730-22

Proposal title

OBSERVER Dr. John Tomsick Principal investigator OBS ID 4583 Observation id SEQ NUM 400365 Sequence number RA NOM 263.4896146013 Nominal RA DEC NOM -22.009111850144 Nominal Dec ROLL NOM 89.489543173702 Nominal Roll

Summary Page Created:Thu May 18, 2006 21:23 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 400365

Instrument: ACIS Obs ID: 4583 Source: 4U 1730-22 PI: Dr. John Tomsick Title: Localizing the X-Ray Transient 4U 1730-22

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 263.489806 -22.032450 530.285706 25.143591 21.090294 263.558353 -21.707499 882.325562 61.896030 14.254962 263.426732 -21.707623 820.664429 62.512920 13.127917 263.559202 -21.741237 649.500000 60.460476 10.742555 263.425555 -21.741253 572.833313 60.963692 9.396303 263.425650 -21.720358 536.936584 59.483597 9.026633 263.511154 -21.915095 130.988632 14.556503 8.998633 263.559259 -21.714384 530.628601 59.841034 8.867303 263.425516 -21.730485 496.208344 58.835747 8.433790 263.715796 -21.920093 174.722733 21.539928 8.111575