Summary Page Created:Wed June 7, 2006 01:25 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500421

Instrument: ACIS Obs ID: 4596 Source: RCW103 PI: Professor Gordon Garmire Title: Observation of SNR RCW103

acisf04596N002 full img2.fits acisf04596N002 cntr img2.fits

Summary Page Created:Wed June 7, 2006 01:25 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500421

Instrument: ACIS Obs ID: 4596 Source: RCW103 PI: Professor Gordon Garmire Title: Observation of SNR RCW103

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-07T04:55:46 Date and time of file creation DATE-OBS 2004-01-27T17:06:46 Observation start date DATE-END 2004-01-27T18:58:57 Observation end date RA PNT 244.38050493896 Pointing RA DEC PNT -50.923408758233 Pointing Dec ROLL PNT 97.481197451693 Pointing Roll RA TARG 244.40125 Observer’s specified target RA DEC TARG -51.040278 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-07T05:24:35 Date and time of file creation DATE-OBS 2004-01-27T17:06:46 Observation start date DATE-END 2004-01-27T18:58:57 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-3 Detector GRATING NONE Grating OBJECT RCW103 Source name TITLE Observation of SNR RCW103 Proposal title OBSERVER Professor Gordon Garmire Principal investigator OBS ID 4596 Observation id SEQ NUM 500421 Sequence number RA NOM 244.38050493896 Nominal RA DEC NOM -50.923408758233 Nominal Dec ROLL NOM 97.481197451693 Nominal Roll

Summary Page Created:Wed June 7, 2006 01:25 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500421

Instrument: ACIS Obs ID: 4596 Source: RCW103 PI: Professor Gordon Garmire Title: Observation of SNR RCW103

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 244.400944 -51.040262 1587.110352 44.921730 35.330570 244.305989 -51.036600 105.488640 24.592619 4.289443 244.286159 -51.064999 51.567501 14.736667 3.499265 244.382417 -51.054711 74.583336 21.527985 3.464483 244.368184 -51.039350 44.358620 13.592633 3.263431 244.392304 -51.051483 49.681820 15.479183 3.209589 244.351222 -51.041324 54.662067 17.091352 3.198230 244.325607 -51.062605 53.034092 16.616980 3.191560 244.281854 -51.059268 36.181820 11.752212 3.078724 244.289091 -51.044961 47.916668 15.815634 3.029703