Summary Page Created:Sat May 20, 2006 07:02 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500422

Instrument: ACIS Obs ID: 4597 Source: RCW103 PI: Professor Gordon Garmire Title: Observation of SNR RCW103

acisf04597N002 full img2.fits acisf04597N002 cntr img2.fits

Summary Page Created:Sat May 20, 2006 07:02 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500422

Instrument: ACIS Obs ID: 4597 Source: RCW103 PI: Professor Gordon Garmire Title: Observation of SNR RCW103

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T10:35:07 Date and time of file creation DATE-OBS 2004-04-26T17:50:15 Observation start date DATE-END 2004-04-26T19:45:40 Observation end date RA PNT 244.53767484567 Pointing RA DEC PNT -50.959832936185 Pointing Dec ROLL PNT 44.233186873423 Pointing Roll RA TARG 244.40125 Observer’s specified target RA DEC TARG -51.040278 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T11:01:29 Date and time of file creation DATE-OBS 2004-04-26T17:50:15 Observation start date DATE-END 2004-04-26T19:45:40 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-3 Detector GRATING NONE Grating OBJECT RCW103 Source name TITLE Observation of SNR RCW103 Proposal title OBSERVER Professor Gordon Garmire Principal investigator OBS ID 4597 Observation id SEQ NUM 500422 Sequence number RA NOM 244.53767484567 Nominal RA DEC NOM -50.959832936185 Nominal Dec ROLL NOM 44.233186873423 Nominal Roll

Summary Page Created:Sat May 20, 2006 07:02 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500422

Instrument: ACIS Obs ID: 4597 Source: RCW103 PI: Professor Gordon Garmire Title: Observation of SNR RCW103

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 244.400800 -51.040288 1057.089600 38.312706 27.591099 244.331841 -51.016948 75.840912 20.972004 3.616293 244.385415 -51.055077 53.166668 15.548818 3.419338 244.335277 -50.996612 69.083336 20.740536 3.330837 244.371149 -51.033514 59.704544 17.990440 3.318682 244.375054 -51.038316 52.636364 16.310925 3.227062 244.383362 -51.051353 46.416668 14.841034 3.127590 244.417506 -51.038049 23.385000 7.653540 3.055449 244.329240 -51.012036 67.306816 22.119415 3.042884