Summary Page Created:Tue May 23, 2006 07:22 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500429

Instrument: ACIS Obs ID: 4604 Source: RX J1606.8+8130 PI: Dr Nestor Mirabal Title: Was the X-ray Afterglow of GRB 970815 Detected, or is 3EG J1621+8203 a Pulsar?

acisf04604N002 full img2.fits acisf04604N002 cntr img2.fits

Summary Page Created:Tue May 23, 2006 07:22 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500429

Instrument: ACIS Obs ID: 4604 Source: RX J1606.8+8130 PI: Dr Nestor Mirabal Title: Was the X-ray Afterglow of GRB 970815 Detected, or is 3EG J1621+8203 a Pulsar?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-23T10:23:34 Date and time of file creation DATE-OBS 2004-06-17T18:50:34 Observation start date DATE-END 2004-06-17T22:33:40 Observation end date RA PNT 241.65337015966 Pointing RA DEC PNT 81.505478365318 Pointing Dec ROLL PNT 203.78863436291 Pointing Roll RA TARG 241.716667 Observer’s specified target RA DEC TARG 81.507778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-23T11:21:42 Date and time of file creation DATE-OBS 2004-06-17T18:50:34 Observation start date DATE-END 2004-06-17T22:33:40 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-23678 Detector GRATING NONE Grating OBJECT RX J1606.8+8130 Source name TITLE Was the X-ray Afterglow of GRB 970815 Detected, or is 3EG J1621+8203 a Pulsar?

Proposal title

OBSERVER Dr Nestor Mirabal Principal investigator OBS ID 4604 Observation id SEQ NUM 500429 Sequence number RA NOM 241.65337015966 Nominal RA DEC NOM 81.505478365318 Nominal Dec ROLL NOM 203.78863436291 Nominal Roll

Summary Page Created:Tue May 23, 2006 07:22 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500429

Instrument: ACIS Obs ID: 4604 Source: RX J1606.8+8130 PI: Dr Nestor Mirabal Title: Was the X-ray Afterglow of GRB 970815 Detected, or is 3EG J1621+8203 a Pulsar?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 240.860467 81.706345 293.078430 21.141438 13.862749 241.480961 81.526209 41.714287 8.179136 5.100085 241.444683 81.565078 34.428570 7.919581 4.347271 242.046341 81.537316 29.000000 6.885837 4.211543 243.020434 81.613055 39.740028 10.770319 3.689773 240.417001 81.612203 29.541529 8.054476 3.667716 241.688483 81.766725 32.750000 9.880125 3.314735 241.854928 81.476575 21.714285 6.589105 3.295483 243.033333 81.613556 34.137257 10.865008 3.141945