Summary Page Created:Wed June 7, 2006 03:42 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500432

Instrument: ACIS Obs ID: 4607 Source: Crab Nebula PI: Frederick Seward Title: Thermal Emission from the Crab Nebula

acisf04607N002 full img2.fits acisf04607N002 cntr img2.fits

Summary Page Created:Wed June 7, 2006 03:42 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500432

Instrument: ACIS Obs ID: 4607 Source: Crab Nebula PI: Frederick Seward Title: Thermal Emission from the Crab Nebula

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-07T05:55:17 Date and time of file creation DATE-OBS 2004-01-27T01:12:47 Observation start date DATE-END 2004-01-27T12:44:52 Observation end date RA PNT 83.634345326513 Pointing RA DEC PNT 21.977068856362 Pointing Dec ROLL PNT 274.15626453735 Pointing Roll RA TARG 83.633333 Observer’s specified target RA DEC TARG 22.014444 Observer’s specified target Dec DATAMODE GRADED Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-07T07:35:40 Date and time of file creation DATE-OBS 2004-01-27T01:12:47 Observation start date DATE-END 2004-01-27T12:44:52 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-23567 Detector GRATING NONE Grating OBJECT Crab Nebula Source name TITLE Thermal Emission from the Crab Nebula

Proposal title

OBSERVER Frederick Seward Principal investigator OBS ID 4607 Observation id SEQ NUM 500432 Sequence number RA NOM 83.634345326513 Nominal RA DEC NOM 21.977068856362 Nominal Dec ROLL NOM 274.15626453735 Nominal Roll

Summary Page Created:Wed June 7, 2006 03:42 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500432

Instrument: ACIS Obs ID: 4607 Source: Crab Nebula PI: Frederick Seward Title: Thermal Emission from the Crab Nebula

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 83.606822 22.022246 3080.795410 177.269196 17.379192 83.593105 21.669812 750.259155 52.023029 14.421674 83.563126 21.953561 444.000000 31.512648 14.089581 83.624532 22.034215 1485.159058 111.212318 13.354267 83.610322 22.026734 1627.204590 122.509911 13.282228 83.404640 21.895168 503.359711 40.387280 12.463323 83.645437 22.029171 1310.920410 109.676651 11.952594 83.623657 22.034194 1348.818237 113.070541 11.928997 83.606406 22.026724 1866.681763 157.118958 11.880692 83.651491 22.028328 2054.454590 175.011154 11.738993