Summary Page Created:Tue May 2, 2006 11:42 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500436

Instrument: ACIS Obs ID: 4611 Source: RCW 86 NE PI: Dr. Jacco Vink Title: Completing our understanding of RCW 86 with Chandra imaging and XMM-Newton high resolution

spectroscopy

acisf04611N003 full img2.fits acisf04611N003 cntr img2.fits

Summary Page Created:Tue May 2, 2006 11:42 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500436

Instrument: ACIS Obs ID: 4611 Source: RCW 86 NE PI: Dr. Jacco Vink Title: Completing our understanding of RCW 86 with Chandra imaging and XMM-Newton high resolution

spectroscopy

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-02T14:14:22 Date and time of file creation DATE-OBS 2004-06-15T04:41:58 Observation start date DATE-END 2004-06-16T01:29:07 Observation end date RA PNT 221.26498542112 Pointing RA DEC PNT -62.351544256257 Pointing Dec ROLL PNT 295.16140891906 Pointing Roll RA TARG 221.259583 Observer’s specified target RA DEC TARG -62.342222 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-02T15:40:58 Date and time of file creation DATE-OBS 2004-06-15T04:41:58 Observation start date DATE-END 2004-06-16T01:29:07 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT RCW 86 NE Source name TITLE Completing our understanding of RCW 86 with Chandra imaging and XMM-Newton high resolution spectroscopy

Proposal title

OBSERVER Dr. Jacco Vink Principal investigator OBS ID 4611 Observation id SEQ NUM 500436 Sequence number RA NOM 221.26498542112 Nominal RA DEC NOM -62.351544256257 Nominal Dec ROLL NOM 295.16140891906 Nominal Roll

Summary Page Created:Tue May 2, 2006 11:42 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500436

Instrument: ACIS Obs ID: 4611 Source: RCW 86 NE PI: Dr. Jacco Vink Title: Completing our understanding of RCW 86 with Chandra imaging and XMM-Newton high resolution

spectroscopy

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 221.423769 -62.651835 1541.920288 78.290581 19.694838 221.662216 -62.600022 1294.375366 78.690636 16.448912 221.339080 -62.500812 532.507507 37.066818 14.366151 221.182834 -62.338917 294.714294 20.954649 14.064387 221.366415 -62.310070 230.386368 18.116774 12.716743 221.419344 -62.526465 951.791687 80.313530 11.850951 221.653890 -62.585594 856.002686 76.480637 11.192410 220.907711 -62.580193 392.958344 38.391914 10.235446 221.412454 -62.513764 534.806885 54.099754 9.885570 221.406815 -62.371873 148.571426 15.031826 9.883791