Summary Page Created:Thu May 25, 2006 11:21 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 500506

Instrument: ACIS Obs ID: 5314 Source: GRB031203 PI: Dr Chryssa Kouveliotou Title: Is GRB 031203 a GRB-SN seen off axis?

acisf05314N002 full img2.fits acisf05314N002 cntr img2.fits

Summary Page Created:Thu May 25, 2006 11:21 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 500506

Instrument: ACIS Obs ID: 5314 Source: GRB031203 PI: Dr Chryssa Kouveliotou Title: Is GRB 031203 a GRB-SN seen off axis?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T14:26:50 Date and time of file creation DATE-OBS 2004-04-18T11:30:41 Observation start date DATE-END 2004-04-18T20:43:17 Observation end date RA PNT 120.62239012327 Pointing RA DEC PNT -39.860063191919 Pointing Dec ROLL PNT 264.14658691032 Pointing Roll RA TARG 120.625833 Observer’s specified target RA DEC TARG -39.850778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T15:20:55 Date and time of file creation DATE-OBS 2004-04-18T11:30:41 Observation start date DATE-END 2004-04-18T20:43:17 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT GRB031203 Source name TITLE Is GRB 031203 a GRB-SN seen off axis?

Proposal title

OBSERVER Dr Chryssa Kouveliotou Principal investigator OBS ID 5314 Observation id SEQ NUM 500506 Sequence number RA NOM 120.62239012327 Nominal RA DEC NOM -39.860063191919 Nominal Dec ROLL NOM 264.14658691032 Nominal Roll

Summary Page Created:Thu May 25, 2006 11:21 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 500506

Instrument: ACIS Obs ID: 5314 Source: GRB031203 PI: Dr Chryssa Kouveliotou Title: Is GRB 031203 a GRB-SN seen off axis?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 120.532276 -39.994390 688.522705 30.123552 22.856625 120.585987 -39.871165 447.857147 23.730856 18.872356 120.503557 -40.155088 1032.159424 62.682652 16.466429 120.662874 -40.167621 783.192688 55.976612 13.991427 120.585124 -39.775480 247.166672 19.828955 12.464937 120.545424 -40.160509 649.195984 63.611183 10.205690 120.504973 -40.136501 599.791077 61.107311 9.815373 120.507019 -40.105699 400.545441 51.163940 7.828667 120.675644 -39.925299 104.857140 14.121172 7.425527 120.669697 -40.133189 376.083344 51.098385 7.359985