Summary Page Created:Sun June 4, 2006 01:36 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600336

Instrument: ACIS Obs ID: 4681 Source: M31-Center PI: Dr. Stephen Murray Title: Searching for Black Hole X-ray Nova in M31

acisf04681N002 e2 full img2.fits acisf04681N002 e2 cntr img2.fits

Summary Page Created:Sun June 4, 2006 01:36 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600336

Instrument: ACIS Obs ID: 4681 Source: M31-Center PI: Dr. Stephen Murray Title: Searching for Black Hole X-ray Nova in M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-04T04:45:24 Date and time of file creation DATE-OBS 2004-01-31T19:19:28 Observation start date DATE-END 2004-01-31T21:20:12 Observation end date RA PNT 10.6926926049 Pointing RA DEC PNT 41.257636106112 Pointing Dec ROLL PNT 305.55059507021 Pointing Roll RA TARG 10.685 Observer’s specified target RA DEC TARG 41.268972 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-04T05:35:18 Date and time of file creation DATE-OBS 2004-01-31T19:19:28 Observation start date DATE-END 2004-01-31T21:20:12 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT M31-Center Source name TITLE Searching for Black Hole X-ray Nova in M31

Proposal title

OBSERVER Dr. Stephen Murray Principal investigator OBS ID 4681 Observation id SEQ NUM 600336 Sequence number RA NOM 10.6926926049 Nominal RA DEC NOM 41.257636106112 Nominal Dec ROLL NOM 305.55059507021 Nominal Roll

Summary Page Created:Sun June 4, 2006 01:36 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600336

Instrument: ACIS Obs ID: 4681 Source: M31-Center PI: Dr. Stephen Murray Title: Searching for Black Hole X-ray Nova in M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.660671 41.267758 687.000000 28.259777 24.310169 10.718759 41.315204 396.954559 21.630651 18.351482 10.696431 41.274654 355.571442 20.516529 17.330975 10.595458 41.259845 360.000000 20.805670 17.302975 10.794183 41.247708 332.857147 21.035435 15.823639 10.554722 41.310227 248.062073 17.539116 14.143362 10.728768 41.267640 241.000000 17.523935 13.752619 10.629610 41.272745 243.142853 17.890224 13.590821 10.617836 41.206525 236.142853 17.681070 13.355687 10.763288 41.257792 193.159088 15.189445 12.716665