Summary Page Created:Mon May 29, 2006 15:12 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600387

Instrument: ACIS Obs ID: 4732 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf04732N002 full img2.fits acisf04732N002 cntr img2.fits

Summary Page Created:Mon May 29, 2006 15:12 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600387

Instrument: ACIS Obs ID: 4732 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T17:52:48 Date and time of file creation DATE-OBS 2004-03-19T08:15:26 Observation start date DATE-END 2004-03-20T04:28:53 Observation end date RA PNT 210.74460545165 Pointing RA DEC PNT 54.378802842951 Pointing Dec ROLL PNT 141.20469989074 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T19:10:46 Date and time of file creation DATE-OBS 2004-03-19T08:15:26 Observation start date DATE-END 2004-03-20T04:28:53 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 4732 Observation id SEQ NUM 600387 Sequence number RA NOM 210.74460545165 Nominal RA DEC NOM 54.378802842951 Nominal Dec ROLL NOM 141.20469989074 Nominal Roll

Summary Page Created:Mon May 29, 2006 15:12 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600387

Instrument: ACIS Obs ID: 4732 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.809683 54.301721 3293.625000 65.154236 50.551205 210.624600 54.355210 2348.428467 53.340775 44.026894 211.059366 54.433936 1266.958374 43.529701 29.105606 210.766312 54.459537 719.458313 28.512760 25.232855 210.839860 54.329327 510.428558 27.958450 18.256683 210.850675 54.330154 471.142853 26.008179 18.115181 210.720257 54.353141 395.571442 22.087736 17.909098 210.272096 54.521858 1496.485107 88.955887 16.822777 210.404234 54.613616 1577.136230 97.577316 16.162939 210.303146 54.504412 1223.666626 87.862976 13.926990