Summary Page Created:Mon April 17, 2006 11:01 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 4735 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf04735N002 full img2.fits acisf04735N002 cntr img2.fits

Summary Page Created:Mon April 17, 2006 11:01 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 4735 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-17T14:06:57 Date and time of file creation DATE-OBS 2004-09-12T12:59:31 Observation start date DATE-END 2004-09-12T21:31:59 Observation end date RA PNT 210.84968217905 Pointing RA DEC PNT 54.311746306332 Pointing Dec ROLL PNT 308.11930875685 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-17T15:00:12 Date and time of file creation DATE-OBS 2004-09-12T12:59:31 Observation start date DATE-END 2004-09-12T21:31:59 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 4735 Observation id SEQ NUM 600390 Sequence number RA NOM 210.84968217905 Nominal RA DEC NOM 54.311746306332 Nominal Dec ROLL NOM 308.11930875685 Nominal Roll

Summary Page Created:Mon April 17, 2006 11:01 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 4735 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.766783 54.459527 920.597473 36.010155 25.564943 210.617545 54.274137 438.125000 25.250076 17.351433 210.839724 54.329357 253.428574 18.095509 14.005054 210.974021 54.160639 301.462067 22.185503 13.588246 211.249491 54.108142 764.508301 59.120876 12.931275 210.850712 54.330181 190.857147 16.366041 11.661777 210.593324 54.299953 187.943176 17.229076 10.908489 211.084999 54.036927 689.777405 65.421669 10.543561 211.206190 54.088870 581.614624 66.885628 8.695659 210.592303 54.299979 159.259995 18.467308 8.623888