Summary Page Created:Thu April 13, 2006 16:19 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600391

Instrument: ACIS Obs ID: 4736 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf04736N002 full img2.fits acisf04736N002 cntr img2.fits

Summary Page Created:Thu April 13, 2006 16:19 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600391

Instrument: ACIS Obs ID: 4736 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-13T18:32:34 Date and time of file creation DATE-OBS 2004-11-01T18:43:09 Observation start date DATE-END 2004-11-02T16:56:38 Observation end date RA PNT 210.88156106627 Pointing RA DEC PNT 54.354410305171 Pointing Dec ROLL PNT 9.2933966231314 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-13T20:16:45 Date and time of file creation DATE-OBS 2004-11-01T18:43:09 Observation start date DATE-END 2004-11-02T16:56:38 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 4736 Observation id SEQ NUM 600391 Sequence number RA NOM 210.88156106627 Nominal RA DEC NOM 54.354410305171 Nominal Dec ROLL NOM 9.2933966231314 Nominal Roll

Summary Page Created:Thu April 13, 2006 16:19 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600391

Instrument: ACIS Obs ID: 4736 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 211.059342 54.434612 3356.208252 66.604607 50.390034 211.409761 54.341133 2847.783936 106.272499 26.796999 210.850796 54.330137 675.571411 28.349377 23.830204 210.618649 54.273539 1079.137939 45.865089 23.528524 211.378306 54.462984 2321.946777 98.877899 23.482971 210.839824 54.329323 613.571411 27.189901 22.566151 210.624926 54.355427 562.284119 30.597584 18.376749 210.623953 54.354859 534.832520 32.556984 16.427582 211.357133 54.461073 1554.824097 100.331123 15.496927 210.720191 54.353257 434.363647 28.375162 15.307882