Summary Page Created:Fri June 2, 2006 14:01 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600403

Instrument: ACIS Obs ID: 4748 Source: NGC 1313 X-1 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

acisf04748N002 full img2.fits acisf04748N002 cntr img2.fits

Summary Page Created:Fri June 2, 2006 14:01 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600403

Instrument: ACIS Obs ID: 4748 Source: NGC 1313 X-1 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-02T17:24:43 Date and time of file creation DATE-OBS 2004-02-22T02:42:35 Observation start date DATE-END 2004-02-22T04:25:33 Observation end date RA PNT 49.575043100738 Pointing RA DEC PNT -66.495389313886 Pointing Dec ROLL PNT 260.43100687979 Pointing Roll RA TARG 49.583333 Observer’s specified target RA DEC TARG -66.486389 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-02T18:00:20 Date and time of file creation DATE-OBS 2004-02-22T02:42:35 Observation start date DATE-END 2004-02-22T04:25:33 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT NGC 1313 X-1 Obs 2 Source name TITLE Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Proposal title

OBSERVER Dr Jon Miller Principal investigator OBS ID 4748 Observation id SEQ NUM 600403 Sequence number RA NOM 49.575043100738 Nominal RA DEC NOM -66.495389313886 Nominal Dec ROLL NOM 260.43100687979 Nominal Roll

Summary Page Created:Fri June 2, 2006 14:01 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600403

Instrument: ACIS Obs ID: 4748 Source: NGC 1313 X-1 Obs 2 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 49.583356 -66.486375 1657.571411 43.137932 38.424919 49.592509 -66.601118 945.342529 37.098339 25.482071 49.575890 -66.501092 66.000000 9.478723 6.962964 49.378824 -66.789784 154.148209 24.015345 6.418738 49.578662 -66.500391 52.000000 8.604178 6.043575 49.379841 -66.793949 123.990036 21.903538 5.660731 49.384037 -66.774232 106.625000 22.253950 4.791284 49.399171 -66.728655 76.666664 18.734058 4.092368 49.522891 -66.504129 30.428572 7.619089 3.993728 49.535216 -66.756168 80.284088 20.768024 3.865755