Summary Page Created:Sun June 4, 2006 09:48 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600406

Instrument: ACIS Obs ID: 4751 Source: M81 X-9 Obs 1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

acisf04751N002 full img2.fits acisf04751N002 cntr img2.fits

Summary Page Created:Sun June 4, 2006 09:48 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600406

Instrument: ACIS Obs ID: 4751 Source: M81 X-9 Obs 1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-04T13:02:54 Date and time of file creation DATE-OBS 2004-02-07T10:55:08 Observation start date DATE-END 2004-02-07T13:03:03 Observation end date RA PNT 149.45084891376 Pointing RA DEC PNT 69.066277642283 Pointing Dec ROLL PNT 169.32666546848 Pointing Roll RA TARG 149.47625 Observer’s specified target RA DEC TARG 69.062889 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-04T13:47:27 Date and time of file creation DATE-OBS 2004-02-07T10:55:08 Observation start date DATE-END 2004-02-07T13:03:03 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M81 X-9 Obs 1 Source name TITLE Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Proposal title

OBSERVER Dr Jon Miller Principal investigator OBS ID 4751 Observation id SEQ NUM 600406 Sequence number RA NOM 149.45084891376 Nominal RA DEC NOM 69.066277642283 Nominal Dec ROLL NOM 169.32666546848 Nominal Roll

Summary Page Created:Sun June 4, 2006 09:48 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600406

Instrument: ACIS Obs ID: 4751 Source: M81 X-9 Obs 1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 149.472189 69.063357 1656.285767 44.934364 36.860115 148.887875 69.068526 1275.933960 39.704453 32.135788 148.955738 69.092474 99.250000 16.073322 6.174828 148.623907 69.147554 122.073090 22.506039 5.424015 148.787656 69.081742 90.274513 18.609337 4.851033 148.610575 69.118089 92.788391 22.028193 4.212256 149.528180 69.077565 30.714285 7.356292 4.175240 148.609228 69.094954 95.369644 23.042347 4.138885 148.717896 69.142957 78.965912 20.550682 3.842496 148.995247 69.090263 24.897499 6.682264 3.725908