Summary Page Created:Mon June 26, 2006 11:54 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600408

Instrument: ACIS Obs ID: 4753 Source: M74 X-1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

acisf04753N002 full img2.fits acisf04753N002 cntr img2.fits

Summary Page Created:Mon June 26, 2006 11:54 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600408

Instrument: ACIS Obs ID: 4753 Source: M74 X-1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T15:38:06 Date and time of file creation DATE-OBS 2003-11-20T04:14:02 Observation start date DATE-END 2003-11-20T06:15:38 Observation end date RA PNT 24.213326339413 Pointing RA DEC PNT 15.753475778361 Pointing Dec ROLL PNT 282.17935427066 Pointing Roll RA TARG 24.212917 Observer’s specified target RA DEC TARG 15.763056 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-26T15:53:07 Date and time of file creation DATE-OBS 2003-11-20T04:14:02 Observation start date DATE-END 2003-11-20T06:15:38 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M74 X-1 Source name TITLE Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Proposal title

OBSERVER Dr Jon Miller Principal investigator OBS ID 4753 Observation id SEQ NUM 600408 Sequence number RA NOM 24.213326339413 Nominal RA DEC NOM 15.753475778361 Nominal Dec ROLL NOM 282.17935427066 Nominal Roll

Summary Page Created:Mon June 26, 2006 11:54 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600408

Instrument: ACIS Obs ID: 4753 Source: M74 X-1 PI: Dr Jon Miller Title: Observations of Intermediate Mass Black Hole Candidate Ultra-Luminous X-ray Sources

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 24.254674 15.449064 100.289040 20.337288 4.931289 24.307190 15.460540 97.142860 21.128527 4.597711 24.250708 15.465620 110.670532 25.354206 4.364977 24.269028 15.454139 99.199997 24.416668 4.062799 24.183845 15.805189 28.238636 7.164156 3.941656 24.305915 15.464452 90.535713 23.196655 3.902964 24.303322 15.485500 82.541664 22.996080 3.589380 24.304796 15.477380 80.341965 22.648943 3.547272 23.938917 15.793263 38.465908 11.068286 3.475327 24.302321 15.497663 64.261360 18.491577 3.475169