Summary Page Created:Mon May 29, 2006 11:25 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600387

Instrument: ACIS Obs ID: 5309 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf05309N002 full img2.fits acisf05309N002 cntr img2.fits

Summary Page Created:Mon May 29, 2006 11:25 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600387

Instrument: ACIS Obs ID: 5309 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T13:29:17 Date and time of file creation DATE-OBS 2004-03-14T01:41:22 Observation start date DATE-END 2004-03-14T22:13:44 Observation end date RA PNT 210.7446047545 Pointing RA DEC PNT 54.378795119791 Pointing Dec ROLL PNT 141.20470143323 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T15:23:48 Date and time of file creation DATE-OBS 2004-03-14T01:41:22 Observation start date DATE-END 2004-03-14T22:13:44 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 5309 Observation id SEQ NUM 600387 Sequence number RA NOM 210.7446047545 Nominal RA DEC NOM 54.378795119791 Nominal Dec ROLL NOM 141.20470143323 Nominal Roll

Summary Page Created:Mon May 29, 2006 11:25 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600387

Instrument: ACIS Obs ID: 5309 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.809703 54.301716 3390.000000 65.348137 51.875999 211.059238 54.433985 1628.000000 47.000893 34.637638 210.766346 54.459548 726.458313 28.639751 25.365387 210.624623 54.355230 612.000000 27.705538 22.089447 210.720249 54.353158 439.571442 23.108038 19.022448 210.271957 54.521711 1646.883667 88.239204 18.663855 210.839856 54.329362 501.142853 28.240477 17.745552 210.404198 54.613608 1616.853760 96.604034 16.736917 210.850648 54.330140 392.428558 24.770330 15.842686 211.070100 54.270508 473.923584 35.349319 13.406866