Summary Page Created:Wed April 19, 2006 12:33 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 6114 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

acisf06114N002 full img2.fits acisf06114N002 cntr img2.fits

Summary Page Created:Wed April 19, 2006 12:33 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 6114 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-19T14:46:08 Date and time of file creation DATE-OBS 2004-09-05T18:23:49 Observation start date DATE-END 2004-09-06T13:20:59 Observation end date RA PNT 210.84969530685 Pointing RA DEC PNT 54.31175301232 Pointing Dec ROLL PNT 308.1193070803 Pointing Roll RA TARG 210.80375 Observer’s specified target RA DEC TARG 54.348778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-19T16:31:14 Date and time of file creation DATE-OBS 2004-09-05T18:23:49 Observation start date DATE-END 2004-09-06T13:20:59 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M101 Source name TITLE An Ultra-Deep Study of M101 Proposal title OBSERVER Dr. K. Kuntz Principal investigator OBS ID 6114 Observation id SEQ NUM 600390 Sequence number RA NOM 210.84969530685 Nominal RA DEC NOM 54.31175301232 Nominal Dec ROLL NOM 308.1193070803 Nominal Roll

Summary Page Created:Wed April 19, 2006 12:33 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600390

Instrument: ACIS Obs ID: 6114 Source: M101 PI: Dr. K. Kuntz Title: An Ultra-Deep Study of M101

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 210.766892 54.459584 2578.227539 59.543541 43.299870 210.617659 54.274153 1157.511353 40.028763 28.916990 211.249434 54.108271 2285.421875 97.254044 23.499506 210.974120 54.160763 882.868958 39.027832 22.621521 210.839744 54.329367 535.428589 25.910351 20.664660 210.850708 54.330167 508.000000 24.746418 20.528223 211.084970 54.036862 2071.229248 105.439873 19.643700 210.900015 54.323542 298.000000 20.392963 14.612884 210.816020 54.296746 261.142853 18.416418 14.179893 210.720306 54.353240 315.166656 23.999134 13.132419